ObjectMon #92 MuonMonitor Slide Show

Run:181309 Event: 6125858 # of Events:48129 Time: Mon Apr 5 23:33:31 2004 Ref.Run:181078

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800 Entries 33282

= 1.3 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 200 400 600 800 1000

Entries 33282

Mean -0.7306

=0.94 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

Entries 33282 Mean -0.07415 RMS 9.052

= 2.1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400

Entries 14146

= 1.7 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 1000

2000

3000

4000

5000

Entries 40226 Mean 0.0030

= 23 (> 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

500

1000

1500

Entries 14146 Mean 0.01483 RMS 12.04

= 1.8 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 50 100 150 200 Entries 5155

= 1.7 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 100 200 300 400 500

Entries 5155 Mean 13.03

= 2.6 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 200 400 600 800 1000

Entries 5155 Mean 0.4171 RMS 10.86

= 3.3 (> 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:181309 Event: 6125858 # of Events:48129 Time: Mon Apr 5 23:33:31 2004 Ref.Run:181078

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40

Entries 1050

= 0.7 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 20 40 60 80 100

Entries 1050

Mean 15.84

= 2.1 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100

Entries 1050 Mean 0.02199 RMS 25.01

= 1.3 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 40226 Mean 2.194 RMS 1.425

= 65 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:181309 Event: 6125858 # of Events:48129 Time: Mon Apr 5 23:33:31 2004 Ref.Run:181078

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200

400

600

Entries 33282 Mean 174.7 RMS 103.1

= 1.3 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 500 1000

1500

2000

Entries 33282 Mean -0.003111 RMS 0.3638

= 1.4 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

Entries 33282 Mean -0.07415 RMS 9.052

= 2.1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300

Entries 14146 Mean 173.1 RMS 102

= 1.4 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 200 400 600 800 1000

Entries 14146 Mean -0.002114 RMS 0.3141

= 1.3 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0

500

1000

1500

Entries 14146 Mean 0.01483 RMS 12.04

= 1.8 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

50

100

150

Entries 5155 Mean 160.6 RMS 106.2

= 1.1 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 100 200 300 400

Entries 5155 Mean 0.02923 RMS 0.8676

= 1.6 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 200 400 600 800 1000

Entries 5155 Mean 0.4171 RMS 10.86

= 3.3 (> 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:181309 Event: 6125858 # of Events:48129 Time: Mon Apr 5 23:33:31 2004 Ref.Run:181078

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 40226 Mean 2.194 RMS 1.425

= 65 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 10^2

10^3

10^4

Entries 37416 Mean 1.075 RMS 1.001

= 56 (> 3) 2χ Number of Muons