160˚E

160˚E

170˚E

170˚E

180˚

180˚

170˚W

170˚W

160˚W

160˚W

150˚W

150˚W

140˚W

140˚W

130˚W

130˚W

50˚N

50˚N

60˚N

60˚N

70˚N

70˚N

Zone A G-R 7-9.2

Zone B G-R 7-8.5

Zone C G-R 7-8 Char 9.2

Yakataga Zone G-R 7-8.1