0 5 10 15 20 25 0 200 400 600 800 1000

1200

1400

1600

3 x10 htemp Nent = 5773900 Mean = 3.915 RMS = 1.83

hc.adc[] {run==2468} htemp

Run 2468. New Pedestal Position.

2002.09.06 19:22

fit: <3.922> +/- 1.357