h1 Entries 25253 Mean 2.996 RMS 0.4505 / ndf

2χ 108.3 / 19 Prob 1.641e-14 Background 34.98±

464.9 Constant 37.87±

2596 Mean 0.0009955 ± 3.087 Sigma 0.00103 ± 0.07936 Slope 11.37±

-33.25

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0

500

1000

1500

2000

2500

3000

± ±

Di-muon mass