0 200 400 600 800 1000

1200

1400

1600

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24 CEM eta,phi Entries 7405 Mean x 20.15 Mean y 2 RMS x 2.229 RMS y -0

Et tower in DCAS != ADMEM: Em E

0 500 1000

1500

2000

2500

3000

3500 2 x10

Et tower (admem)

0 10 20 30 40 50 60 70 80 90 100

Et tower (dcas)

0 10 20 30 40 50 60 70 80 90 100 CEM Entries 681043 Mean x 2.426 Mean y 2.414 RMS x 3.524 RMS y 3.525

DCAS trigger tower Et vs ADMEM Em E

0

50

100

150

200

250

eta 0 2 4 6 8 10 12 14 16 18 20 22 24 phi

0 2 4 6 8 10 12 14 16 18 20 22 24 CHA eta,phi Entries 788 Mean x 20.6 Mean y 2 RMS x 2.185 RMS y -0

Et tower in DCAS != ADMEM: Had E

0 200 400 600 800 1000

1200

1400

1600

1800 2 x10

Et tower (admem)

0 10 20 30 40 50 60 70 80 90 100

Et tower (dcas)

0 10 20 30 40 50 60 70 80 90 100 CHA Entries 346568 Mean x 2.525 Mean y 2.515 RMS x 3.702 RMS y 3.686

DCAS trigger tower Et vs ADMEM Had E

TrigMon #136 L1TriggerMonitor L1 DCAS-ADMEM comparisons

Run:156099 Event: 2574555 # of Events:3740 Time: Sat Jan 4 10:10:17 2003