0 20 40 60 80 100

1

10

10^2

ADC, Tower=06TE12c3 06TE12c3

Entries 2595 Mean 18.11 RMS 15.97 Underflow 0 Overflow 4 Integral 2585 / ndf

2χ 13.2 / 14 Prob 0.511 Constant 0.06784 ± 6.025 Slope 0.003402 ± -0.07142

ADC, Tower=06TE12c3

0 20 40 60 80 100

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 efficiency for ADC, Tower=06TE12c3 06TE12c3

Entries 0 Mean 43.07 RMS 27 Underflow 0 Overflow 0 Integral 12.19 / ndf

2χ 5.674 / 19 Prob 0.9986 Constant 0.1151 ± 0.4253 Mean 61.03±

-59.55 Sigma 114.8±

132.7

efficiency for ADC, Tower=06TE12c3