ObjectMon #97 MuonMonitor Slide Show

Run:206828 Event: 6267423 # of Events:69087 Time: Tue Nov 8 07:15:53 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 100 120 140 160 180 Entries 6597

= 1.4 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 50 100 150 200

Entries 6597

Mean 1.055

=0.85 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

Entries 6597 Mean -0.08551 RMS 8.11

=0.84 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 60 80 100 120 Entries 3994

=0.95 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0

500

1000

1500

Entries 10502

Mean 0.0097

= 1.1 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500

Entries 3994 Mean 0.1436 RMS 11.37

=0.88 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80

Entries 2519

=0.96 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 50 100 150 200

Entries 2519

Mean 0.5416

= 0.4 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 100 200 300 400 500 600

Entries 2519 Mean 0.6343 RMS 13.11

=0.59 (< 3) 2χ xΔ CMX

ObjectMon #98 MuonMonitor Slide Show 1

Run:206828 Event: 6267423 # of Events:69087 Time: Tue Nov 8 07:15:53 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40

Entries 1084

= 1.3 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0

50

100

150

Entries 1084

Mean -34.53

= 1.4 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 10 20 30 40 50 60

Entries 1084 Mean 1.408 RMS 31

= 1.3 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

210

310

Entries 10502 Mean 3.086 RMS 1.946

= 1.8 (< 3) 2χ Muon Type

ObjectMon #94 MuonMonitor Muons by System

Run:206828 Event: 6267423 # of Events:69087 Time: Tue Nov 8 07:15:53 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 80 100 120 140

Entries 6597 Mean 178.8 RMS 104.6

=0.99 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 100 200 300 400

Entries 6597 Mean 0.00284 RMS 0.3459

=0.79 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600 800 1000

Entries 6597 Mean -0.08551 RMS 8.11

=0.84 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 40 60 80 100

Entries 3994 Mean 175.6 RMS 104.2

= 1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200 250

Entries 3994 Mean 0.007817 RMS 0.3142

=0.71 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500

Entries 3994 Mean 0.1436 RMS 11.37

=0.88 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 20 30 40 50 60

Entries 2519 Mean 166.5 RMS 104.6

= 1.2 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200

Entries 2519 Mean 0.004581 RMS 0.859

=0.33 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 100 200 300 400 500 600

Entries 2519 Mean 0.6343 RMS 13.11

=0.59 (< 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Muons Generic

Run:206828 Event: 6267423 # of Events:69087 Time: Tue Nov 8 07:15:53 2005 Ref.Run:205314

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

210

310

Entries 10502 Mean 3.086 RMS 1.946

= 1.8 (< 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310 410 510 Entries 68219 Mean 0.1539 RMS 0.5126

= 7.6 (> 3) 2χ Number of Muons