datset GDAC scan - FLEX 1 masked with Bad pixel map, Default cuts - FLEX. Module "510701"

Column

Row

0 500 1000

1500

2000

2500

3000

3500

4000

S-curve mean - not-masked pixels

Constant 5459 Mean 2741 Sigma 133.1

S-curve mean

0 500 1000 1500 2000 2500 3000 3500 4000 0 1000

2000

3000

4000

5000

S-curve mean - not-masked pixels histo

Constant 2.306 Mean 2516 Sigma 206.9

S-curve mean

0 500 1000 1500 2000 2500 3000 0 0.5 1 1.5 2 2.5 3 S-curve mean - masked pixels histo