generator p140502_m_50_dig_515 vs p140700_m_50_dig_514

-50 -40 -30 -20 -10 0 10 20 30 40 50 0

0.1

0.2

0.3

0.4

0.5

Id part id_part

Entries 2002 Mean -0.02997 RMS 14 Underflow 0 Overflow 0

Id part

0 10 20 30 40 50 60 0

0.2

0.4

0.6

0.8

1

Pt part pt_part

Entries 2002 Mean 49.95 RMS 1.473 Underflow 0 Overflow 0

Pt part

-8 -6 -4 -2 0 2 4 6 8 0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

Eta part eta_part

Entries 2002 Mean 0.01888 RMS 2.038 Underflow 0 Overflow 0

Eta part

0 1 2 3 4 5 6 0

0.002

0.004

0.006

0.008

0.01

0.012

Phi part phi_part

Entries 2002 Mean 3.059 RMS 1.825 Underflow 0 Overflow 0

Phi part

-8 -6 -4 -2 0 2 4 6 8

0 1 2 3 4 5 6 0 0.0002

0.0004

0.0006

0.0008

0.001

0.0012

0.0014

0.0016

0.0018

0.002

0.0022

Phi vs eta part_{phi_vs_eta_part}

Entries 2002 Mean x 0.01888 Mean y 3.059 RMS x 2.038 RMS y 1.825 0 0 0 0 1 0 0 0 0

Phi vs eta part

-8 -6 -4 -2 0 2 4 6 8

0 1 2 3 4 5 6 0 0.0002

0.0004

0.0006

0.0008

0.001

0.0012

0.0014

0.0016

0.0018

0.002

0.0022

Phi vs eta part_{phi_vs_eta_part}

Entries 2000 Mean x 0.01945 Mean y 3.06 RMS x 2.039 RMS y 1.826 0 0 0 0 1 0 0 0 0

Phi vs eta part

Nb of hit cells p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 500 1000 1500 2000 2500 3000 3500 4000 0

0.1

0.2

0.3

0.4

0.5

Nb. of cells calo CAL_NDIG

Entries 2000 Mean 400.3 RMS 20.01 Underflow 0 Overflow 0

Nb. of cells calo

0 500100015002000250030003500400045005000 0

0.2

0.4

0.6

0.8

1 nb. of FPS digi fps_ndig

Entries 2000 Mean 2.342 RMS 4.399 Underflow 0 Overflow 0

nb. of FPS digi

0 500100015002000250030003500400045005000 0

0.2

0.4

0.6

0.8

1 nb. of CFT digi cft_ndig

Entries 2000 Mean 14.86 RMS 15.81 Underflow 0 Overflow 0

nb. of CFT digi

0 100 200 300 400 500 600 700 800 9001000 0

0.2

0.4

0.6

0.8

1 nb. of CPS digi cps_ndig

Entries 2000 Mean 0.0005 RMS 0.02236 Underflow 0 Overflow 0

nb. of CPS digi

0 2000400060008000100001200014000160001800020000 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45 nb. of SMT disk digi_{smt_ndig_disk}

Entries 2000 Mean 8814 RMS 138.8 Underflow 0 Overflow 0

nb. of SMT disk digi

0 5000 10000 15000 20000 25000 0

0.1

0.2

0.3

0.4

0.5 nb. of SMT barrel digi smt_ndig_b

Entries 2000 Mean 8509 RMS 105.7 Underflow 0 Overflow 0

nb. of SMT barrel digi

Calorimeter digi: 2 p140502_m_50_dig_515 vs p140700_m_50_dig_514

CAL_NDIG

Entries 2000 Mean 400.3 RMS 20.01 Underflow 0 Overflow 0

0 500 1000 1500 2000 2500 3000 3500 4000 0

0.1

0.2

0.3

0.4

0.5

Nb. of cells calo CAL_NDIG

Nb. of cells calo

0 200 400 600 800 1000 1200 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

Nb of calo towers EM CAL_NT0

Entries 2000 Mean 163.3 RMS 12.65 Underflow 0 Overflow 0

Nb of calo towers EM

0 200 400 600 800 1000 1200 0

0.05

0.1

0.15

0.2

0.25

0.3

Nb of calo towers Hadr CAL_NT1

Entries 2000 Mean 213.3 RMS 14.45 Underflow 0 Overflow 0

Nb of calo towers Hadr

0 20 40 60 80 100 120 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

0.24

Nb of calo towers icd_cmg CAL_NT2

Entries 2000 Mean 12.03 RMS 3.389 Underflow 0 Overflow 0

Nb of calo towers icd_cmg

CAL digi: 3 p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 100 200 300 400 500 600 700 800 9001000 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

0.4 Tot. energy calo CAL_EDIG

Entries 2000 Mean 14.67 RMS 27.34 Underflow 0.156 Overflow 0

Tot. energy calo

0 0.010.02 0.030.04 0.050.06 0.070.08 0.09 0.1 0

0.2

0.4

0.6

0.8

1

1.2

1.4

Tower energy EM CAL_ET0

Entries 326598 Mean 0.03952 RMS 0.02351 Underflow 81.99 Overflow 7.319

Tower energy EM

0 0.010.02 0.030.04 0.050.06 0.070.08 0.09 0.1 0

0.2

0.4

0.6

0.8

1

1.2

1.4

Tower energy Hadr CAL_ET1

Entries 426587 Mean 0.04215 RMS 0.02608 Underflow 101.7 Overflow 52.47

Tower energy Hadr

0 0.01 0.020.030.04 0.050.06 0.070.08 0.09 0.1 0

0.01

0.02

0.03

0.04

0.05

0.06

Tower energy icd_cmg CAL_ET2

Entries 24060 Mean 0.08676 RMS 0.01105 Underflow 5.941 Overflow 5.51

Tower energy icd_cmg

CAL nb of hits and energy per layer p140502_m_50_dig_515 vs p140700_m_50_dig_514

2 4 6 8 10 12 0

1

2

3

4

5

6

7

8

9

Layer energy vs layer CAL_EDIG_LAYER

Entries 14039 Mean 6.827 RMS 3.206 Underflow 0 Overflow 0

Layer energy vs layer

2 4 6 8 10 12 0

10

20

30

40

50

60

70

80

Nb of cells vs layer _{CAL_NDIG_LAYER}

Entries 22730 Mean 6.749 RMS 3.375 Underflow 0 Overflow 0

Nb of cells vs layer

CAL eta vs phi EM: cont3 p140502_m_50_dig_515 vs p140700_m_50_dig_514

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 cell map EM H_ETAXPH0

Entries 334672 Mean x 0.4248 Mean y 32.07 RMS x 19.21 RMS y 18.3 0 2 0 0 164 0 0 0 0

cell map EM

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.1

0.2

0.3

0.4

0.5 cell map EM H_ETAXPH0

Entries 334629 Mean x 0.4328 Mean y 32.05 RMS x 19.18 RMS y 18.32 0 2 0 0 164 0 0 0 0

cell map EM

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60

-0.02 -0 0.02

0.04

0.06

0.08 0.1 cell weighted by Pt EM H_ETAXPH1

Entries 1428 Mean x 1.232 Mean y 32.23 RMS x 16.11 RMS y 17.97 0 0 0 0 1 0 0 0 0

cell weighted by Pt EM

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -0.02 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16 cell weighted by Pt EM H_ETAXPH1

Entries 1428 Mean x -0.3644 Mean y 32.57 RMS x 15.59 RMS y 18.41 0 0 0 0 1 0 0 0 0

cell weighted by Pt EM

CAL eta vs phi Hadr: cont4 p140502_m_50_dig_515 vs p140700_m_50_dig_514

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 cell map Hadr H_ETAXPH3

Entries 441751 Mean x -0.03547 Mean y 31.98 RMS x 20.89 RMS y 18.29 0 3 0 0 217 0 0 0 0

cell map Hadr

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 cell map Hadr H_ETAXPH3

Entries 441248 Mean x 0.06601 Mean y 31.94 RMS x 20.88 RMS y 18.3 0 3 0 0 217 0 0 0 0

cell map Hadr

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 cell weighted by Pt Hadr H_ETAXPH4

Entries 1428 Mean x 0.2333 Mean y 31.37 RMS x 14.81 RMS y 18.6 0 0 0 0 13 0 0 0 0

cell weighted by Pt Hadr

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 cell weighted by Pt Hadr H_ETAXPH4

Entries 1428 Mean x 0.002831 Mean y 31.2 RMS x 14.57 RMS y 18.46 0 0 0 0 14 0 0 0 0

cell weighted by Pt Hadr

CAL eta vs phi ICD: cont5 p140502_m_50_dig_515 vs p140700_m_50_dig_514

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.02

0.04

0.06

0.08

0.1 cell map icd_cmg H_ETAXPH6

Entries 24211 Mean x 0.1296 Mean y 31.9 RMS x 10.4 RMS y 18.24 0 0 0 0 11 0 0 0 0

cell map icd_cmg

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.02

0.04

0.06

0.08

0.1 cell map icd_cmg H_ETAXPH6

Entries 24491 Mean x 0.248 Mean y 32.27 RMS x 10.41 RMS y 18.21 0 0 0 0 12 0 0 0 0

cell map icd_cmg

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 cell weighted by Pt icd_cmg H_ETAXPH7

Entries 1428 Mean x 1.645 Mean y 31.02 RMS x 11.1 RMS y 18.87 0 0 0 0 2 0 0 0 0

cell weighted by Pt icd_cmg

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -0.2

-0.15

-0.1

-0.05 -0 0.05 0.1 0.15 cell weighted by Pt icd_cmg H_ETAXPH7

Entries 1428 Mean x 1.463 Mean y 31.94 RMS x 11.09 RMS y 19.12 0 0 0 0 1 0 0 0 0

cell weighted by Pt icd_cmg

SMT barrel digi :

p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 100 200 300 400 500 600 700 800 9001000 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7 tot Energy SMT bar digi smt_edig_b

Entries 2000 Mean 129 RMS 2.705 Underflow 0 Overflow 0

tot Energy SMT bar digi

0 10 20 30 40 50 60 0

20

40

60

80

100

120

140

160

180

SMT layer map vs barrel v1 smt_l_0

Entries 9743693 Mean 30.53 RMS 17.3 Underflow 0 Overflow 0

SMT layer map vs barrel v1

0 10 20 30 40 50 60 0

20

40

60

80

100

120

140

SMT layer map vs barrel v2 smt_l_1

Entries 7274300 Mean 30.74 RMS 15.58 Underflow 0 Overflow 0

SMT layer map vs barrel v2

0 2 4 6 8 10 12 14 16 18 0

100

200

300

400

500

600

700

800

SMT barrel map V1/v2 smt_b

Entries 1.701799e+07

Mean 6.793

RMS 5.22

Underflow 0

Overflow 0

SMT barrel map V1/v2 smt_ndig_b

Entries 2000 Mean 8509 RMS 105.7 Underflow 0 Overflow 0

0 5000 10000 15000 20000 25000 0

0.1

0.2

0.3

0.4

0.5 nb. of SMT barrel digi smt_ndig_b nb. of SMT barrel digi smt_edig_b

Entries 2000 Mean 129 RMS 2.705 Underflow 0 Overflow 0

0 100 200 300 400 500 600 700 800 9001000 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7 tot Energy SMT bar digi smt_edig_b tot Energy SMT bar digi

SMT F disks digi :

p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 5 10 15 20 25 30 35 0

50

100

150

200

250 fdisk nb of strips per layer v1/v2 fdisk_nstrip

Entries 48000 Mean 16 RMS 10.58 Underflow 0 Overflow 0

fdisk nb of strips per layer v1/v2

0 5 10 15 20 25 30 35 0

0.5

1

1.5

2

2.5

3

3.5

4

4.5 fdisk_e_tot layer v1/v2 fdisk_etot_l

Entries 48000 Mean 16 RMS 10.58 Underflow 0 Overflow 0

fdisk_e_tot layer v1/v2

0 200 400 600 800 1000 1200 1400 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 fdisk_ntot fdisk_ntot

Entries 24000 Mean 479.7 RMS 32.43 Underflow 0 Overflow 0

fdisk_ntot

0 5 10 15 20 25 30 35 40 45 50 0

0.5

1

1.5

2

2.5

3

3.5

4

4.5 fdisk_etot fdisk_etot

Entries 24000 Mean 7.064 RMS 0.588 Underflow 0 Overflow 0

fdisk_etot

SMT H disks digi :

p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 5 10 15 20 25 30 35 0

50

100

150

200

250

300

350

400 hdisk nb of strips per layer v1/v2 hdisk_nstrip

Entries 16000 Mean 6.708 RMS 5.077 Underflow 0 Overflow 0

hdisk nb of strips per layer v1/v2

0 2 4 6 8 10 12 14 0

1

2

3

4

5

6 hdisk_e_tot layer v1/v2 hdisk_etot_l

Entries 16000 Mean 6.589 RMS 5.109 Underflow 0 Overflow 0

hdisk_e_tot layer v1/v2

0 200 400 600 800 1000 1200 1400 0

0.1

0.2

0.3

0.4

0.5 hdisk_ntot hdisk_ntot

Entries 8000 Mean 764.3 RMS 42.57 Underflow 0 Overflow 0

hdisk_ntot

0 5 10 15 20 25 30 35 40 45 50 0

0.2

0.4

0.6

0.8

1

1.2 hdisk_etot hdisk_etot

Entries 8000 Mean 11.36 RMS 0.6183 Underflow 0 Overflow 0

hdisk_etot

CPS digi cont 2 p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 -1

-0.5

0

0.5

1

CPS strip energy layer 0. cps_ener0

Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0

CPS strip energy layer 0.

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 -1

-0.5

0

0.5

1

CPS strip energy layer 1. cps_ener1

Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0

CPS strip energy layer 1.

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0

0.001

0.002

0.003

0.004

0.005 -1 x10 CPS strip energy layer 2. cps_ener2

Entries 1 Mean 0.008 RMS 1.2e-10 Underflow 0 Overflow 0

CPS strip energy layer 2.

CPS digi cont 4 p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.2

0.4

0.6

0.8

1

CPS total energy layer 0. cps_etot0

Entries 2000 Mean 0 RMS -0 Underflow 0 Overflow 0

CPS total energy layer 0.

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.2

0.4

0.6

0.8

1

CPS total energy layer 0. cps_etot1

Entries 2000 Mean 0 RMS -0 Underflow 0 Overflow 0

CPS total energy layer 0.

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.2

0.4

0.6

0.8

1

CPS total energy layer 0. cps_etot2

Entries 2000

Mean 4e-06

RMS 0.0001788

Underflow 0 Overflow 0

CPS total energy layer 0.

CFT digi p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 2 4 6 8 10 12 14 16 0

0.2

0.4

0.6

0.8

1

CFT nb. of hit vs layer nb cft_dig_nhit

Entries 32000 Mean 7.504 RMS 4.796 Underflow 0 Overflow 0

CFT nb. of hit vs layer nb

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT axial_{cft_x_vs_y_ax}

Entries 15080 Mean x -1.092 Mean y 0.378 RMS x 26.32 RMS y 27.26 0 0 0 0 15080 0 0 0 0

Y Vs X, CFT axial

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT axial_{cft_x_vs_y_ax}

Entries 15054 Mean x -0.445 Mean y 0.8235 RMS x 26.48 RMS y 27.08 0 0 0 0 15054 0 0 0 0

Y Vs X, CFT axial

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT stereo_{cft_x_vs_y_st}

Entries 14645 Mean x -1.105 Mean y 0.7338 RMS x 26.45 RMS y 27.24 0 0 0 0 14645 0 0 0 0

Y Vs X, CFT stereo

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT stereo_{cft_x_vs_y_st}

Entries 14753 Mean x -0.3273 Mean y 0.8305 RMS x 26.54 RMS y 27.18 0 0 0 0 14753 0 0 0 0

Y Vs X, CFT stereo

FPS digi p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 2 4 6 8 10 12 14 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35 nb. of dig per layer North/South fps_ndig_l

Entries 1276 Mean 6.052 RMS 5.103 Underflow 0 Overflow 0

nb. of dig per layer North/South

0 0.0010.0020.0030.0040.0050.0060.0070.0080.0090.01 -1

-0.5

0

0.5

1

Energy FPS digi fps_edig

Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0

Energy FPS digi

muon digi: nb of hits p140502_m_50_dig_515 vs p140700_m_50_dig_514

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu barrel chamber nmu_00

Entries 2000 Mean 3.711 RMS 6.872 Underflow 0 Overflow 0

Nb. of dig mu barrel chamber

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu barrel scint nmu_01

Entries 2000 Mean 1.26 RMS 2.773 Underflow 0 Overflow 0

Nb. of dig mu barrel scint

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu north chamber nmu_10

Entries 2000 Mean 2.252 RMS 6.277 Underflow 0 Overflow 0

Nb. of dig mu north chamber

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu north scint nmu_11

Entries 2000 Mean 1.256 RMS 3.803 Underflow 0 Overflow 0

Nb. of dig mu north scint

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu south chamber nmu_20

Entries 2000 Mean 2.502 RMS 8.682 Underflow 0 Overflow 0

Nb. of dig mu south chamber

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu south scint nmu_21

Entries 2000 Mean 1.566 RMS 12.51 Underflow 0 Overflow 0

Nb. of dig mu south scint

muon digi: X vs Y chambers p140502_m_50_dig_515 vs p140700_m_50_dig_514

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel chamber_{mu_x_vs_y00}

Entries 7422 Mean x 9.93 Mean y 82.28 RMS x 351 RMS y 321.4 0 0 0 0 7422 0 0 0 0

X vs Y barrel chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north chamber_{mu_x_vs_y10}

Entries 4503 Mean x 6.856 Mean y 23.38 RMS x 219.2 RMS y 212.4 0 0 0 0 4503 0 0 0 0

X vs Y north chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south chamber_{mu_x_vs_y20}

Entries 5003 Mean x -14.14 Mean y 45.77 RMS x 251 RMS y 228.2 0 0 0 0 5003 0 0 0 0

X vs Y south chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel chamber_{mu_x_vs_y00}

Entries 8010 Mean x 30.16 Mean y 73.19 RMS x 349.8 RMS y 321.6 0 0 0 0 8010 0 0 0 0

X vs Y barrel chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north chamber_{mu_x_vs_y10}

Entries 4506 Mean x 13.47 Mean y 18.08 RMS x 227.7 RMS y 205.9 0 0 0 0 4506 0 0 0 0

X vs Y north chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south chamber_{mu_x_vs_y20}

Entries 4849 Mean x -5.234 Mean y 19.66 RMS x 256.8 RMS y 237.3 0 0 0 0 4849 0 0 0 0

X vs Y south chamber

muon digi: X vs Y scint.

p140502_m_50_dig_515 vs p140700_m_50_dig_514

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel scint_{mu_x_vs_y01}

Entries 2519 Mean x 8.942 Mean y 59.45 RMS x 345.3 RMS y 331.1 0 0 0 0 2519 0 0 0 0

X vs Y barrel scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north scint_{mu_x_vs_y11}

Entries 2511 Mean x 19.58 Mean y 40.31 RMS x 243.5 RMS y 229.3 0 0 0 0 2511 0 0 0 0

X vs Y north scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south scint_{mu_x_vs_y21}

Entries 3132 Mean x -53.7 Mean y 47.51 RMS x 266.7 RMS y 241.3 0 0 0 0 3132 0 0 0 0

X vs Y south scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel scint_{mu_x_vs_y01}

Entries 2627 Mean x 24.17 Mean y 47.93 RMS x 350.5 RMS y 323.5 0 0 0 0 2627 0 0 0 0

X vs Y barrel scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north scint_{mu_x_vs_y11}

Entries 2565 Mean x 19.17 Mean y 30.86 RMS x 243.2 RMS y 228.8 0 0 0 0 2565 0 0 0 0

X vs Y north scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south scint_{mu_x_vs_y21}

Entries 2744 Mean x 4.439 Mean y 26.95 RMS x 268.6 RMS y 240.3 0 0 0 0 2744 0 0 0 0

X vs Y south scint