                    [  Help : How to make this plot?  ]

(1) Select data: Click  "Select Data" -> "New" on the menu bar.
                 Select "image data".
                 Click "Select CDF/Key Parameter"
                 Click "OK => Go Plot" to make a plot in default settings

(2) Customize the plot:

  1. Select the desired individual image from the selected group images.
  2. Click "plot image with magnetic coordinates".
     Note: This option is available to Polar/UVI images only - plotting
           method of magnetic coordinates was developed by Glynn Germany of
           UAH from Polar/UVI team.
  3. Click "Change plot settings" on the image plot control interface and then
     "Change Color Scales for individual image".
  4. Select "Common Color Scaling" and adjust the slider to the desired values.
  5. Click "Apply the Changes" and then "Exit"


(3) Click "Save" on the image plot control to save as GIF file.

(4) Click "Create/Update a Plot File" to create a Plot File for reuse.
