ATTENUATOR

SECOND AMPFIRST AMP.

Tubular Filter

FROM WAVEGUIDE-COAX TRNSITIONSCHEMATIC OF THE 2.3 GHz RF CHAIN

TEMP.SENSOR

DETECTORDIODE

ATTENUATOR

TO DC AMPLIFIER

HEATER