A(31:1)

GA(4:0)

VME_AM0

VME_AM1

VME_AM2

VME_AM3

VME_AM4

VME_AM5

VME_LWORD

VME_IACK

VME_AS

VME_DS0

VME_DS1

XRESET ACK NTA0

NTA1

NTA2

NTA3

NTA4

NTA5

DATA_OE

VMEBUS_WRITE

VME_WRITE

U131XC3164PQ160

151152153142160131130

1201121111109091

73707172495051

109829303139

PWRDWN

IO_160/TCLKIN

IO_156/A9

IO_155/A10

IO_151/A11

IO_152/A8

IO_153

IO_154

IO_148/A7

IO_147/A12

IO_144

IO_143

IO_141/A13

141IO_142/A6

IO_137/A5

IO_136/A14

136IO_134

IO_135

IO_133/A4

IO_132/A15

IO_131

IO_130

129IO_129/A3

IO_128/A2

IO_127

IO_125/A1/CS2

IO_124/A0/WS

CCLK

IO_120/DOUT

IO_119/D0/DIN

IO_118

IO_117

IO_114/D1

IO_115/RCLK/RDY_BUSY

IO_113

IO_112

IO_111

IO_110

IO_108/D2

IO_106

IO_103/CS1

IO_95

IO_94

IO_93/CSO

IO_92/D5

IO_89

IO_91

IO_90

89IO_87

IO_86/D6

IO_84

IO_83

81IO_82/XTL1/BCLKIN

IO_81/D7

DONE/PG

RESET

IO_76/XTL2

IO_72

IO_71

IO_70

IO_59/INIT

IO_49/LDC

IO_51

IO_50

IO_48

IO_45/HDC

IO_44/M2

M0/RTRIG

M1/RDATA

IO_39

IO_38

IO_37

IO_31

IO_30

IO_29

IO_13

IO_10

IO_9

IO_8

IO_7

IO_6

IO_3

IO_1

1IO_2

IO_138

138137135134133132128127IO_126

126125124121

119118117IO_116

116115114113IO_109

109108IO_107

107106IO_105

105IO_104

104103IO_102/D3

102IO_99

99IO_98/D4

98IO_97

97IO_96

9695949392IO_88

888786IO_85

85848382

8078IO_75

IO_74

767574IO_73

IO_69

69IO_68

68IO_67

67IO_66

66IO_65

65IO_64

64IO_63

63IO_62

62IO_57

IO_58

585957IO_56

56IO_55

55IO_54

54IO_53

53IO_52

5248IO_47

47IO_46

46454442

403837IO_36

IO_35

IO_34

IO_33

36353433IO_32

32IO_28

28IO_27

27IO_26

26IO_25

25IO_24

24IO_23

23IO_22

22IO_21

21IO_18

18IO_17

17IO_16

16IO_15

15IO_14

1413IO_12

12IO_11

1176IO_5

5IO_4 43

159156155154IO_150

150IO_149

149148147IO_146

146IO_145

145144143

2

U130

16234XC17128-PD8C

OE/RESET

DATA CEO CLK CEGND VCC XINIT

XPROGRAM

Fermi National Accelerator Lab CDF UPGRADE

ELECTRONICS

Theresa M. Shaw

RD/EED/EES

A1 of 1CDF Front-End Slave Interface

XILINX Interface IC

SHAW-12-01-95-P3-A

SIZED

SHEET REV DWG NO

FSMC NO

SCALE

DESCRIPTION

DATE

APPROVED

REVISIONSCDB47ACDBA123DWG NO

SNREV8564713856rd_idprom

rd_diag wr_diag

R63RES_1/4W_RC07

4700

R644700

RES_1/4W_RC07

U138

65474F38N

74F38

wr_cntrl rd_cntrl wr_fifo(7:0) rd_fifo(7:0) wr_delay_reg rd_delay_reg rd_status

TP48

TP49

TP50

TP51

TP47

TP46

TP45

TP44

TP33

TP32

TP31

TP30

TP20

TP19

TP18

TP17

TP15

TP16

TP14

TP13

TP11

TP12

TP9TP7TP8

TP6TP5TP4TP3TP2TP1TP21

TP22

TP26

TP27

TP23

TP28

TP24

TP29

TP25

TP34

TP39

TP35

TP40

TP41

TP36

TP37

TP42

TP43

TP38

TP10

A(1)

A(2)

A(3)

A(4)

A(5)

A(6)

A(7)

A(8)

A(9)

A(10)

A(11)

A(12)

A(13)

A(14)

A(15)

A(16)

A(17)

A(18)

A(19)

A(20)

A(21)

A(22)

A(23)

A(24)

A(25)

A(26)

A(27)

A(28)

A(29)

A(30)

A(31)

GA(4)

GA(3)

GA(2)

GA(1)

GA(0)

NTA5

NTA4 rd_idprom wr_diag rd_diag wr_fifo(7) wr_fifo(6) wr_fifo(5) wr_fifo(4) wr_fifo(3) wr_fifo(2) wr_fifo(1) wr_fifo(0) rd_cntrl wr_cntrl rd_fifo(0) rd_fifo(1) rd_fifo(2) rd_fifo(3) rd_fifo(4) rd_fifo(5) rd_fifo(6) rd_fifo(7)

E:\Coop_Ppd_jobs\tscr_v2\vbdc\schematic.sbk!vme_slave111(15;66) Wed Mar 17 09:34:24 1999