ObjectMon #92 MuonMonitor Slide Show

Run:195745 Event: 1494367 # of Events:19047 Time: Sat Mar 26 15:39:52 2005 Ref.Run:194147

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20

30

40

50

Entries 1825

= 1.3 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 10 20 30 40 50 60

Entries 1825

Mean 4.783

= 1.4 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400

Entries 1825 Mean -0.0956 RMS 6.863

= 4 (> 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 15 20 25 30 35 40 45 Entries 1416

=0.91 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400 500

Entries 2491 Mean 0.0024

= 6.8 (> 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200

Entries 1416 Mean -0.04798 RMS 8.958

= 2 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20

Entries 475

=0.95 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 10 20 30 40

Entries 475 Mean 38.44

= 1.3 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

50

100

Entries 475 Mean -0.006673 RMS 11.09

=0.78 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:195745 Event: 1494367 # of Events:19047 Time: Sat Mar 26 15:39:52 2005 Ref.Run:194147

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 1 2 3 4 5 6 Entries 106

=0.68 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 2 4 6 8 10

Entries 106

Mean -34.08

=0.52 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 2 4 6 8 10 12

Entries 106 Mean -1.379 RMS 25.14

=0.81 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1

10

210

310

Entries 2491 Mean 2.896 RMS 1.383

= 12 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:195745 Event: 1494367 # of Events:19047 Time: Sat Mar 26 15:39:52 2005 Ref.Run:194147

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 25 30 35 40 45

Entries 1825 Mean 177.3 RMS 102

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100 120

Entries 1825 Mean 0.007633 RMS 0.3361

= 0.6 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400

Entries 1825 Mean -0.0956 RMS 6.863

= 4 (> 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 15 20 25 30 35 40

Entries 1416 Mean 177.6 RMS 102.8

= 1.1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100

Entries 1416 Mean 0.002822 RMS 0.3098

=0.88 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200

Entries 1416 Mean -0.04798 RMS 8.958

= 2 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 25

Entries 475 Mean 169.1 RMS 103.2

= 1.1 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 10 20 30 40

Entries 475 Mean 0.07985 RMS 0.8508

= 1.4 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

50

100

Entries 475 Mean -0.006673 RMS 11.09

=0.78 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:195745 Event: 1494367 # of Events:19047 Time: Sat Mar 26 15:39:52 2005 Ref.Run:194147

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 210 310

Entries 2491 Mean 2.896 RMS 1.383

= 12 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 10 210 310

Entries 6974 Mean 0.3572 RMS 0.7146

= 4.9 (> 3) 2χ Number of Muons