ISSUED

CHECKED

DRAWN

APPROVALS

DATE

CONTRACT NO.

SCALE

FSCM NO.

DWG. NO.

SHEET

SIZE

REV12345678765431ABCDCBAPPROVED

DESCRIPTION

REVREVISIONS

SH.REVDGND

U4574FCT162543

2B8332B7342B6362B5372B4382B3402B2412B1422A8242A7232A6212A5202A4192A3172A2162A1151B8431B7441B6451B5471B4481B3491B2511B1521A8141A7131A6121A5101A491A381A261A152LEAB

272CEAB

262OEAB

282LEBA

302CEBA

312OEBA

291OEBA

1LEAB

21CEAB

31OEAB

1LEBA

551CEBA

5456U4674FCT162543

5456GND GND BD(0)

BD(1)

BD(2)

BD(3)

BD(4)

BD(5)

BD(6)

BD(7)

BD(8)

BD(9)

BD(10)

BD(11)

BD(12)

BD(13)

BD(14)

BD(15)

U5274FCT162240T

4Y34Y24Y14Y03Y33Y23Y13Y02Y32Y22Y12Y01Y31Y21Y11Y04A34A24A14A03A33A23A13A02A32A22A12A01A31A21A11A024254814OE3OE2OE2227202919301732163314351336123711389408416435443461OE23264774AC11

U115

121213CTS 206-4S 1455-9704

SPST4

S156784321B3B2B1B4A4A3A2A174AC11008

U117

1514374AC11000

U118

11106U122

74HC85D

8VCC

16IA>B

4IA=B

3IA<B

2A>B

56A=B A<B 7B31B214B111B09A315A213A112A0101uFC134

ROHM MCH312F105ZP

R671.0K

10KR501.82K

R68100K

R120

74AC11000

9874AC11000

U119

16274AC11000

1110674AC11000

1514374AC11

346574AC11

U116

12121374AC11

3465.001uF

C136

74AC11008

U117

16274AC11008

9874AC11008

11106100K

R122

100K

R123

R121 VCC

R661.0K

HP HLMP-1719

D50VCC

JMP1

1 pin jumper

1U5374FCT162245

2227202919301732163314351336123711389408416435443461OE2OE1DIR

2DIR

1A11A21A31A41A51A61A71A82A12A22A32A42A52A62A72A81B11B21B31B41B51B61B71B82B12B22B32B42B52B62B72B81232425264748CD74HC423

CD74HC423

U114

1091112576BARESET

RXCX

CXQ981011U116

74AC11S

981011U115

1415134312U114

BARESET

CXQC401

.001uF

789U216

61011U216

U216

3141574AC11008

2161U216

C403

0.1UF

D51BAT54CW 213

R296

200K

GNDU120

SN74HC138D

12345615141312111097Q7Q6Q5Q4Q3Q2Q1Q0E3E2E1A2A1A0U121

12345615141312111097Q7Q6Q5Q4Q3Q2Q1Q0E3E2E1A2A1A0GND

R295

147K

1324172410249241924152416241424824724182421242324222424124CALIFORNIA MICRO DEVICES

# PRN111 24 1002 FAP

1 COMMON &

23 RESISTOR

10 K SMT BUSSED

TERMINATION NETWORK

7 uS ONE SHOT

100 uS ONE SHOT

20 MilliSec One Shot

MODULE ADDRESSED LED

PPD / EET / ES (STANFORD 3U)

BACKPLANE BUFFERS & LOGIC

4 OF 10

CSR0

DATA BUFFER

CSR1

ADDRESS BUFFER

READ/WRITE

DECODERS

TRUTH TABLE FOR

74FCT162240 &

74FCT162245

B TO A

A TO B

OUTPUTS ARE OFF

(TRISTATE)

LHXLHDIROEOPERATION

INPUTSBACKPLANE

BUFFERS

CONTROL STATUS

REGISTER

ADDRESS SELECTION SWITCH

ADDRESS

DECODER

6 CHANNEL DRIVER MODULE V2

BD(0..15)

D14A0D15D13D12D11D10D9D8D7D6D5D4D3D2D1D0A1A2A8A9A10A12READ

WRITE

POLARITY2

POLARITY1

POLARITY0

GAIN2_1or10

GAIN2_2or5

GAIN2_1or2

GAIN1_1or10

GAIN1_2or5

GAIN1_1or2 ARD READ_CSR0

READ_CSR1

BREAD

BWRITE

SA0SA1SA2SYSTEM_RESET

PS_RESET AWT WRITE_DAC0

WRITE_DAC1

DAC0CS

DAC1CS

GAIN0_1or10

GAIN0_2or5

GAIN0_1or2

POLARITY5

POLARITY4

POLARITY3

GAIN5_1or10

GAIN5_2or5

GAIN5_1or2

GAIN4_1or10

GAIN4_2or5

GAIN4_1or2

GAIN3_1or10

GAIN3_2or5

GAIN3_1or2

WRT_CSRS

WRITE_CSR1

WRITE_CSR0

ARD + AWT

DISABLECSR_WRITE

BD(0..15)C:\jobs\driver\vbdc\SCHEMATIC.sbk(04;36) Fri Apr 03 09:45:28 1998