Filtering track results — Institut de Recherche en Informatique de Toulouse IRIT/SIG Routing runs

Run Mer9r2 Sub task routing Query construction automatic .M field used? no TREC data used in training? no non-TREC data used ? no Optimized for Average Precision Topic set OHSU Total retrieved: 63000 Total relevant: 3205 Total rels retrieved: 1964

Interpolated Recall-Precision Averages Recall Precision 0.00 0.6250 0.10 0.4241 0.20 0.3187 0.30 0.2693 0.40 0.2239 0.50 0.1764 0.60 0.1195 0.70 0.0852 0.80 0.0243 0.90 0.0000 1.00 0.0000 Non-interpolated average precision 0.1845 Document Level Averages Precision At 5 docs 0.4127 At 10 docs 0.3651 At 15 docs 0.3249 At 20 docs 0.2960 At 30 docs 0.2656 At 50 docs 0.2171 At 100 docs 0.1624 At 200 docs 0.1082 At 500 docs 0.0559 At 1000 docs 0.0312 R-precision 0.2309

Run mer9r1 Sub task routing Query construction automatic .M field used? no TREC data used in training? no non-TREC data used ? no Optimized for Average Precision Topic set OHSU Total retrieved: 63000 Total relevant: 3205 Total rels retrieved: 2483

Interpolated Recall-Precision Averages Recall Precision 0.00 0.6838 0.10 0.5186 0.20 0.3990 0.30 0.3299 0.40 0.2706 0.50 0.2241 0.60 0.1555 0.70 0.1090 0.80 0.0699 0.90 0.0305 1.00 0.0030 Non-interpolated average precision 0.2355 Document Level Averages Precision At 5 docs 0.4603 At 10 docs 0.4238 At 15 docs 0.4011 At 20 docs 0.3706 At 30 docs 0.3360 At 50 docs 0.2794 At 100 docs 0.2027 At 200 docs 0.1337 At 500 docs 0.0699 At 1000 docs 0.0394 R-precision 0.2784