datset VCAL scan antikill - BURN 1 masked with Bad pixel map, Default cuts - BURN. Module "510733"

Column

Row

0 100 200 300 400 500 600 Noise (e) - not-masked pixels

Constant 9910 Mean 161.9 Sigma 10.93

Noise (e)

0 100 200 300 400 500 600 0 2000

4000

6000

8000

10000

Noise (e) - not-masked pixels histo

Constant 1.005 Mean 411.8 Sigma 2474

Noise (e)

0 100 200 300 400 500 600 700 800 0 0.2 0.4 0.6 0.8 1 Noise (e) - masked pixels histo