Run 152422 p11.07

0 1 2 3 4 5 6

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08 0.1 Nent = 50 Mean = 3.326 Chi2 / ndf = 2472 / 47 0.0003096 ± x0 = 0.005238 0.0002985 ± y0 = -0.02713

Fitted value of par[1]=Mean ± ±

0 1 2 3 4 5 6

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

Nent = 50 Mean = 2.873 Chi2 / ndf = 486.7 / 47 6.746e-05 ± x0 = 0.009676 6.848e-05 ± y0 = -0.0176

Fitted value of par[1]=Mean ± ±

(rad) dφ CFT:

0 1 2 3 4 5 6

DCA (cm)

-1 -0.8

-0.6

-0.4

-0.2 -0 0.2 0.4 0.6 0.8 1

(rad) dφ SMT:

0 1 2 3 4 5 6

DCA (cm)

-0.5

-0.4

-0.3

-0.2

-0.1 -0 0.1 0.2 0.3 0.4 0.5