-15 -10 -5 0 5 10 15 20 25 0

500

1000

1500

2000

2500

3000 3 x10 htemp Nent = 5773900 Mean = 0.2578 RMS = 0.9321

hc.adc[] {run==2462} htemp

Old Pedestal. Run 2462

all channels. 2000 events. 20 time slices before 2002.09.06 19:00