10S

0

10N

20N

30N

140W 130W 120W 110W 100W 90W 80W

20

20

24

24

24 28 32

16

16 16

16 16 14

14

14

14

14

14 12

12

12

12 12 08

NWS/NCEP - Tropical Prediction Center/TAFB