Studying Z dependence of COT Hit Width

Following up on Rolf’s slides from last week • Require |z_0| < 50.0 • Require | cot(θ)| < 0.2 Plot Mean Width Vs. Z for All SL

• Compare 142671(blue) with 168770(red)

Mean Width Vs Z: SL1-4 Blue = 142671, Red = 168770

Mean Width Vs Z: SL5-8 Blue = 142671, Red = 168770

Fit Slope - Run 142671 SL1-4

Fit Slope - Run 168770 SL1-4

Fit Slope - Run 142671 SL5-8

Fit Slope - Run 168770 SL5-8

Comparison of Fitted Slopes and Means

SL Slope (142671) Slope (168770) Mean (142671) Mean (168770) 1 +0.003 −0.026 31.5 28.8 2 −0.016 −0.050 34.8 31.6 3 −0.019 −0.025 33.4 27.6 4 +0.009 −0.006 32.2 30.7 5 +0.015 +0.001 32.6 31.4 6 −0.014 −0.021 31.6 31.0 7 −0.022 −0.025 31.6 31.2 8 +0.008 +0.004 31.3 31.2