Web Track, mixed-query task results — University of Alaska Fairbanks

Summary Statistics Run ID: irtbow Run Description NoAnchorText-NoLinkStruct, NoDocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 20689 13905 2401 4383 Relevant: 1763 1600 80 83 Rel-ret: 308 243 31 34 Official task measures All topics TD NP HP Average Precision: 0.0850 0.0120 0.1582 0.0849 Success@1: 0.0711 0.0533 0.1200 0.0400 Success@5: 0.1333 0.1067 0.1733 0.1200 Success@10: 0.2311 0.2267 0.2933 0.1733 Precision @ 10 docs: 0.0293 Precision @ “R” docs: 0.0610 0.0229 0.1200 0.0400 Mean repirocal rank: 0.1149 0.1000 0.1589 0.0857 Topics with no relevant found: 108 22 45 41

Summary Statistics Run ID: irtphr2 Run Description NoAnchorText-NoLinkStruct, DocStruct, NoURLLength-NoURLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 34198 23938 2410 7850 Relevant: 1763 1600 80 83 Rel-ret: 339 291 23 25 Official task measures All topics TD NP HP Average Precision: 0.0598 0.0084 0.1392 0.0317 Success@1: 0.0489 0.0000 0.1200 0.0267 Success@5: 0.0933 0.0800 0.1733 0.0267 Success@10: 0.1244 0.1333 0.2000 0.0400 Precision @ 10 docs: 0.0173 Precision @ “R” docs: 0.0533 0.0133 0.1200 0.0267 Mean repirocal rank: 0.0740 0.0508 0.1393 0.0317 Topics with no relevant found: 124 18 53 53

Web Track, mixed-query task results — University of Alaska Fairbanks

Summary Statistics Run ID: irttil Run Description NoAnchorText-NoLinkStruct, NoDocStruct, NoURLLength-URLFeatures Number of Topics: 225 (75 distillation, 75 named-page, 75 homepage)

Total number of documents All topics TD NP HP Retrieved: 11567 8646 231 2690 Relevant: 1763 1600 80 83 Rel-ret: 220 176 16 28 Official task measures All topics TD NP HP Average Precision: 0.0795 0.0179 0.1300 0.0907 Success@1: 0.0800 0.0667 0.1200 0.0533 Success@5: 0.1333 0.1467 0.1333 0.1200 Success@10: 0.1644 0.1733 0.1467 0.1733 Precision @ 10 docs: 0.0293 Precision @ “R” docs: 0.0657 0.0239 0.1200 0.0533 Mean repirocal rank: 0.1075 0.1028 0.1294 0.0902 Topics with no relevant found: 151 39 61 51