]^2 mass [GeV/c B +π ^-π ^+K

5 5.5 6

Number of entries / 10 MeV

0

200

400

600

B 0

/NDF = 151.6/125 2χ Prob = 5.30 % 59 candidates ± 2406

-1 270 pb ≈L CDF Preliminary (RS)