adc13 Entries 10222 Mean 42.75 RMS 7.063 Underflow 0 Overflow 0

ADC Counts

10 20 30 40 50 60 70 80 90 100 0 200 400 600 800 1000

1200

1400

1600

1800

2000

adc13tCut Entries 5465 Mean 46.03 RMS 7.521 Underflow 0 Overflow 0

ADC Counts in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0 50 100 150 200 250 300 350 400 adc13tCut

adc13notCut Entries 4757 Mean 38.98 RMS 3.963 Underflow 0 Overflow 0

ADC Counts not in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0 200 400 600 800 1000

1200

1400

1600

1800 adc13notCut

tdc13 Entries 44025 Mean 442.4 RMS 307.3 Underflow 0 Overflow 0

TDC hits

200 400 600 800 1000 0 100 200 300 400 500 600 700 800 900 tdc13 adc17 Entries 10222 Mean 54.93 RMS 7.49 Underflow 0 Overflow 0

ADC Counts

10 20 30 40 50 60 70 80 90 100 0 100 200 300 400 500 600 700

adc17tCut Entries 7832 Mean 56.64 RMS 7.225 Underflow 0 Overflow 0

ADC Counts in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0

100

200

300

400

500

adc17notCut Entries 2390 Mean 49.32 RMS 5.276 Underflow 0 Overflow 0

ADC Counts not in TDC windowcut

10 20 30 40 50 60 70 80 90 100 0 50 100 150 200 250 300 350 400

tdc17 Entries 53163 Mean 445.9 RMS 303.2 Underflow 0 Overflow 0

TDC hits

200 400 600 800 1000 0 200 400 600 800 1000

1200

1400 tdc17