generator p1405_mu_dig_0512 vs p1409_mu_dig_0512

-50 -40 -30 -20 -10 0 10 20 30 40 50 0

0.1

0.2

0.3

0.4

0.5

Id part id_part

Entries 1002 Mean 0.3034 RMS 13.99 Underflow 0 Overflow 0

Id part

0 10 20 30 40 50 60 0

0.2

0.4

0.6

0.8

1

Pt part pt_part

Entries 1002 Mean 49.89 RMS 2.08 Underflow 0 Overflow 0

Pt part

-8 -6 -4 -2 0 2 4 6 8 0

0.01

0.02

0.03

Eta part eta_part

Entries 1002 Mean 0.02847 RMS 2.02 Underflow 0 Overflow 0

Eta part

0 1 2 3 4 5 6 0

0.01

Phi part phi_part

Entries 1002 Mean 3.079 RMS 1.838 Underflow 0 Overflow 0

Phi part

-8 -6 -4 -2 0 2 4 6 8

0 1 2 3 4 5 6 0

Phi vs eta part phi_vs_eta_part

Entries 1002 Mean x 0.02847 Mean y 3.079 RMS x 2.02 RMS y 1.838 0 0 0 0 1 0 0 0 0

Phi vs eta part

-8 -6 -4 -2 0 2 4 6 8

0 1 2 3 4 5 6 0

Phi vs eta part phi_vs_eta_part

Entries 1000 Mean x 0.02961 Mean y 3.079 RMS x 2.022 RMS y 1.839 0 0 0 0 1 0 0 0 0

Phi vs eta part

Nb of hit cells p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 1000 2000 3000 4000 5000 6000 7000 8000 0

0.1

0.2

0.3

0.4

0.5

Nb. of cells calo CAL_NDIG

Entries 1000 Mean 398.9 RMS 19.87 Underflow 0 Overflow 0

Nb. of cells calo

0 500 100015002000250030003500400045005000 0

0.2

0.4

0.6

0.8

1

nb. of FPS digi fps_ndig

Entries 1000 Mean 2.237 RMS 4.168 Underflow 0 Overflow 0

nb. of FPS digi

0 500 100015002000250030003500400045005000 0

0.2

0.4

0.6

0.8

1

nb. of CFT digi cft_ndig

Entries 1000 Mean 15.34 RMS 17.24 Underflow 0 Overflow 0

nb. of CFT digi

0 100 200 300 400 500 600 700 800 900 1000 0

0.2

0.4

0.6

0.8

1

nb. of CPS digi cps_ndig

Entries 1000 Mean 0.49 RMS 1.255 Underflow 0 Overflow 0

nb. of CPS digi

0 2000400060008000100001200014000160001800020000 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

0.4

0.45

nb. of SMT disk digi smt_ndig_disk

Entries 1000 Mean 8813 RMS 135.5 Underflow 0 Overflow 0

nb. of SMT disk digi

0 5000 10000 15000 20000 25000 0

0.1

0.2

0.3

0.4

0.5

nb. of SMT barrel digi smt_ndig_b

Entries 1000 Mean 8511 RMS 106.2 Underflow 0 Overflow 0

nb. of SMT barrel digi

Calorimeter digi: 2 p1405_mu_dig_0512 vs p1409_mu_dig_0512

CAL_NDIG

Entries 1000 Mean 398.9 RMS 19.87 Underflow 0 Overflow 0

0 1000 2000 3000 4000 5000 6000 7000 8000 0

0.1

0.2

0.3

0.4

0.5

Nb. of cells calo CAL_NDIG

Nb. of cells calo

0 500 1000 1500 2000 2500 3000 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

Nb of calo towers EM CAL_NT0

Entries 1000 Mean 162.9 RMS 12.76 Underflow 0 Overflow 0

Nb of calo towers EM

0 500 1000 1500 2000 2500 3000 0

0.1

0.2

0.3

0.4

0.5

Nb of calo towers Hadr CAL_NT1

Entries 1000 Mean 212.5 RMS 14.22 Underflow 0 Overflow 0

Nb of calo towers Hadr

0 20 40 60 80 100 120 140 160 180 200 0

0.05

0.1

0.15

0.2

0.25

Nb of calo towers icd_cmg CAL_NT2

Entries 1000 Mean 11.93 RMS 3.285 Underflow 0 Overflow 0

Nb of calo towers icd_cmg

CAL digi: 3 p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 100 200 300 400 500 600 700 800 900 1000 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

Tot. energy calo CAL_EDIG

Entries 1000 Mean 14.76 RMS 29.18 Underflow 0.161 Overflow 0

Tot. energy calo

0 0.010.020.030.040.050.060.070.080.09 0.1 0

0.2

0.4

0.6

0.8

1

1.2

1.4

Tower energy EM CAL_ET0

Entries 162939 Mean 0.0398 RMS 0.0236 Underflow 82.09 Overflow 6.831

Tower energy EM

0 0.010.020.030.040.050.060.070.080.09 0.1 0

0.2

0.4

0.6

0.8

1

1.2

Tower energy Hadr CAL_ET1

Entries 212469 Mean 0.04344 RMS 0.02599 Underflow 101.4 Overflow 52.4

Tower energy Hadr

0 0.010.020.030.040.050.060.070.080.09 0.1 0

0.01

0.02

Tower energy icd_cmg CAL_ET2

Entries 11929 Mean 0.07638 RMS 0.01077 Underflow 5.857 Overflow 5.894

Tower energy icd_cmg

CAL nb of hits and energy per layer p1405_mu_dig_0512 vs p1409_mu_dig_0512

2 4 6 8 10 12 0

2

4

6

8

10

Layer energy vs layer CAL_EDIG_LAYER

Entries 6944 Mean 6.859 Meany 2.364 RMS 3.187 RMSy 10.23 Underflow 0 Overflow 0

Layer energy vs layer

2 4 6 8 10 12 0

10

20

30

40

50

60

70

80

Nb of cells vs layer ^{CAL_NDIG_LAYER}

Entries 11327 Mean 6.733 Meany 35.22 RMS 3.37 RMSy 22.41 Underflow 0 Overflow 0

Nb of cells vs layer

CAL eta vs phi EM: cont3 p1405_mu_dig_0512 vs p1409_mu_dig_0512

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.01

cell map EM H_ETAXPH0

Entries 1498 Mean x 2.863 Mean y 32.26 RMS x 17.09 RMS y 18.44 0 0 0 0 1 0 0 0 0

cell map EM

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.01

cell map EM H_ETAXPH0

Entries 1557 Mean x 3.227 Mean y 31.55 RMS x 17.36 RMS y 18.46 0 0 0 0 1 0 0 0 0

cell map EM

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60

0 2 4 6 8 10 12

cell weighted by Pt EM H_ETAXPH1

Entries 1498 Mean x 13.59 Mean y 32.44 RMS x 16.22 RMS y 14.71 0 0 0 0 9 0 0 0 0

cell weighted by Pt EM

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60

-0.1

0 0.05 0.1 0.15

cell weighted by Pt EM H_ETAXPH1

Entries 1557 Mean x 3.553 Mean y 31.41 RMS x 13.67 RMS y 19.31 0 0 0 0 0 0 0 0 0

cell weighted by Pt EM

CAL eta vs phi Hadr: cont4 p1405_mu_dig_0512 vs p1409_mu_dig_0512

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.01

0.02

0.03

0.04

cell map Hadr H_ETAXPH3

Entries 2963 Mean x -8.24 Mean y 30.3 RMS x 24.68 RMS y 18.37 0 0 0 0 2 0 0 0 0

cell map Hadr

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

0.01

0.02

0.03

0.04

0.05

cell map Hadr H_ETAXPH3

Entries 2921 Mean x -8.463 Mean y 30.08 RMS x 24.63 RMS y 18.6 0 0 0 0 2 0 0 0 0

cell map Hadr

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60

-1 0 1 2 3 4

cell weighted by Pt Hadr H_ETAXPH4

Entries 2963 Mean x 2.873 Mean y 30.78 RMS x 11.05 RMS y 19.27 0 0 0 0 3 0 0 0 0

cell weighted by Pt Hadr

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -1 -0.5 0 0.5 1 1.5

cell weighted by Pt Hadr H_ETAXPH4

Entries 2921 Mean x 2.429 Mean y 31.79 RMS x 11.07 RMS y 18.08 0 -1 0 0 2 0 0 0 0

cell weighted by Pt Hadr

CAL eta vs phi ICD: cont5 p1405_mu_dig_0512 vs p1409_mu_dig_0512

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

cell map icd_cmg H_ETAXPH6

Entries 10 Mean x 6.7 Mean y 30.1 RMS x 9.155 RMS y 15.55 0 0 0 0 0 0 0 0 0

cell map icd_cmg

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 0

cell map icd_cmg H_ETAXPH6

Entries 6 Mean x -0.1667 Mean y 42.17 RMS x 12.23 RMS y 16.73 0 0 0 0 0 0 0 0 0

cell map icd_cmg

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60

-0.2

-0.1 0 0.1 0.2 0.3

cell weighted by Pt icd_cmg H_ETAXPH7

Entries 10 Mean x 6.317 Mean y 30.23 RMS x 10.01 RMS y 16.45 0 0 0 0 0 0 0 0 0

cell weighted by Pt icd_cmg

-40 -30 -20 -10 0 10 20 30 40

0 10 20 30 40 50 60 -0.3

-0.2

-0.1

0 0.05 0.1

cell weighted by Pt icd_cmg H_ETAXPH7

Entries 6 Mean x -1.218 Mean y 43.32 RMS x 12.06 RMS y 19.36 0 0 0 0 0 0 0 0 0

cell weighted by Pt icd_cmg

SMT barrel digi :

p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 100 200 300 400 500 600 700 800 900 1000 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

tot Energy SMT bar digi smt_edig_b

Entries 1000 Mean 129 RMS 2.658 Underflow 0 Overflow 0

tot Energy SMT bar digi

0 10 20 30 40 50 60 0

20

40

60

80

100

120

140

160

180

SMT layer map vs barrel v1 smt_l_0

Entries 4872886 Mean 30.52 RMS 17.3 Underflow 0 Overflow 0

SMT layer map vs barrel v1

0 10 20 30 40 50 60 0

20

40

60

80

100

120

140

SMT layer map vs barrel v2 smt_l_1

Entries 3638569 Mean 30.73 RMS 15.58 Underflow 0 Overflow 0

SMT layer map vs barrel v2

0 2 4 6 8 10 12 14 16 18 0

100

200

300

400

500

600

700

800

SMT barrel map V1/v2 smt_b

Entries 8511455 Mean 6.792 RMS 5.22 Underflow 0 Overflow 0

SMT barrel map V1/v2 smt_ndig_b

Entries 1000 Mean 8511 RMS 106.2 Underflow 0 Overflow 0

0 5000 10000 15000 20000 25000 0

0.1

0.2

0.3

0.4

0.5

nb. of SMT barrel digi smt_ndig_b nb. of SMT barrel digi smt_edig_b

Entries 1000 Mean 129 RMS 2.658 Underflow 0 Overflow 0

0 100 200 300 400 500 600 700 800 9001000 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

tot Energy SMT bar digi smt_edig_b tot Energy SMT bar digi

SMT F disks digi :

p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 5 10 15 20 25 30 35 0

50

100

150

200

250

fdisk nb of strips per layer v1/v2 fdisk_nstrip

Entries 24000 Mean 16 Meany 239.7 RMS 10.58 RMSy 44.58 Underflow 0 Overflow 0

fdisk nb of strips per layer v1/v2

0 5 10 15 20 25 30 35 0

0.5

1

1.5

2

2.5

3

3.5

4

4.5

fdisk_e_tot layer v1/v2 fdisk_etot_l

Entries 24000 Mean 16 Meany 3.529 RMS 10.58 RMSy 0.6626 Underflow 0 Overflow 0

fdisk_e_tot layer v1/v2

0 200 400 600 800 1000 1200 1400 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2

fdisk_ntot fdisk_ntot

Entries 12000 Mean 479.5 RMS 32.44 Underflow 0 Overflow 0

fdisk_ntot

0 5 10 15 20 25 30 35 40 45 50 0

0.5

1

1.5

2

2.5

3

3.5

4

4.5

fdisk_etot fdisk_etot

Entries 12000 Mean 7.059 RMS 0.5868 Underflow 0 Overflow 0

fdisk_etot

SMT H disks digi :

p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 5 10 15 20 25 30 35 0

50

100

150

200

250

300

350

400

hdisk nb of strips per layer v1/v2 hdisk_nstrip

Entries 8000 Mean 6.708 Meany 382.4 RMS 5.077 RMSy 34.65 Underflow 0 Overflow 0

hdisk nb of strips per layer v1/v2

0 2 4 6 8 10 12 14 0

1

2

3

4

5

6

hdisk_e_tot layer v1/v2 hdisk_etot_l

Entries 8000 Mean 6.589 Meany 5.683 RMS 5.109 RMSy 0.511 Underflow 0 Overflow 0

hdisk_e_tot layer v1/v2

0 200 400 600 800 1000 1200 1400 0

0.1

0.2

0.3

0.4

0.5

hdisk_ntot hdisk_ntot

Entries 4000 Mean 764.8 RMS 42.8 Underflow 0 Overflow 0

hdisk_ntot

0 5 10 15 20 25 30 35 40 45 50 0

0.2

0.4

0.6

0.8

1

hdisk_etot hdisk_etot

Entries 4000 Mean 11.37 RMS 0.6244 Underflow 0 Overflow 0

hdisk_etot

CPS digis p1405_mu_dig_0512 vs p1409_mu_dig_0512

CPS digi cont 2

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0

0.01

0.02

0.03

CPS strip energy layer 0. cps_ener0

Entries 151

Mean 0.001746

RMS 0.002162

Underflow 0

Overflow 0

CPS strip energy layer 0.

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0

0.01

0.02

0.03

CPS strip energy layer 1. cps_ener1

Entries 166

Mean 0.001634

RMS 0.001781

Underflow 0

Overflow 0

CPS strip energy layer 1.

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04 0

0.01

0.02

0.03

0.04

CPS strip energy layer 2. cps_ener2

Entries 173

Mean 0.001525

RMS 0.002036

Underflow 0

Overflow 0

CPS strip energy layer 2.

CPS digi cont 4 p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.2

0.4

0.6

0.8

1

CPS total energy layer 0. cps_etot0

Entries 1000

Mean 0.0002637

RMS 0.001573

Underflow 0

Overflow 0

CPS total energy layer 0.

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.2

0.4

0.6

0.8

1

CPS total energy layer 0. cps_etot1

Entries 1000

Mean 0.0002713

RMS 0.001255

Underflow 0

Overflow 0

CPS total energy layer 0.

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.2

0.4

0.6

0.8

1

CPS total energy layer 0. cps_etot2

Entries 1000

Mean 0.0002639

RMS 0.001565

Underflow 0

Overflow 0

CPS total energy layer 0.

CFT digi p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 2 4 6 8 10 12 14 16 0

0.2

0.4

0.6

0.8

1

1.2 CFT nb. of hit vs layer nb cft_dig_nhit

Entries 16000 Mean 7.504 Meany 0.9587 RMS 4.796 RMSy 1.64 Underflow 0 Overflow 0

CFT nb. of hit vs layer nb

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT axial cft_x_vs_y_ax

Entries 7799 Mean x -1.406 Mean y 0.2522 RMS x 25.94 RMS y 27.91 0 0 0 0 7799 0 0 0 0

Y Vs X, CFT axial

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT axial cft_x_vs_y_ax

Entries 7939 Mean x -1.03 Mean y -0.6475 RMS x 27.39 RMS y 25.77 0 0 0 0 7939 0 0 0 0

Y Vs X, CFT axial

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT stereo cft_x_vs_y_st

Entries 7541 Mean x -1.487 Mean y 0.6249 RMS x 25.99 RMS y 27.86 0 0 0 0 7541 0 0 0 0

Y Vs X, CFT stereo

-40 -20 0 20 40

-40

-20

0

20

40

Y Vs X, CFT stereo cft_x_vs_y_st

Entries 7520 Mean x -1.683 Mean y -0.2417 RMS x 27.25 RMS y 26.21 0 0 0 0 7520 0 0 0 0

Y Vs X, CFT stereo

FPS digi p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 2 4 6 8 10 12 14 0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

nb. of dig per layer North/South fps_ndig_l

Entries 609 Mean 6.005 RMS 5.111 Underflow 0 Overflow 0

nb. of dig per layer North/South

0 0.0010.0020.0030.0040.0050.0060.0070.0080.0090.01 -1

-0.5

0

0.5

1

Energy FPS digi fps_edig

Entries 0 Mean 0 RMS 0 Underflow 0 Overflow 0

Energy FPS digi

muon digi: nb of hits p1405_mu_dig_0512 vs p1409_mu_dig_0512

0 200 400 600 800100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu barrel chamber nmu_00

Entries 1000 Mean 3.718 RMS 6.747 Underflow 0 Overflow 0

Nb. of dig mu barrel chamber

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu barrel scint nmu_01

Entries 1000 Mean 1.203 RMS 2.097 Underflow 0 Overflow 0

Nb. of dig mu barrel scint

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu north chamber nmu_10

Entries 1000 Mean 2.187 RMS 5.586 Underflow 0 Overflow 0

Nb. of dig mu north chamber

0 200 400 600 800100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu north scint nmu_11

Entries 1000 Mean 1.217 RMS 3.042 Underflow 0 Overflow 0

Nb. of dig mu north scint

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu south chamber nmu_20

Entries 1000 Mean 2.363 RMS 6.951 Underflow 0 Overflow 0

Nb. of dig mu south chamber

0 200 400 600 800 100012001400160018002000 0

0.2

0.4

0.6

0.8

1

Nb. of dig mu south scint nmu_21

Entries 1000 Mean 1.273 RMS 4.209 Underflow 0 Overflow 0

Nb. of dig mu south scint

muon digi: X vs Y chambers p1405_mu_dig_0512 vs p1409_mu_dig_0512

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel chamber mu_x_vs_y00

Entries 3718 Mean x 7.922 Mean y 92.68 RMS x 346.6 RMS y 323.1 0 0 0 0 3718 0 0 0 0

X vs Y barrel chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north chamber mu_x_vs_y10

Entries 2187 Mean x 10.88 Mean y 8.355 RMS x 220.4 RMS y 213.2 0 0 0 0 2187 0 0 0 0

X vs Y north chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south chamber mu_x_vs_y20

Entries 2363 Mean x -3.045 Mean y 37.53 RMS x 258.1 RMS y 231.9 0 0 0 0 2363 0 0 0 0

X vs Y south chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel chamber mu_x_vs_y00

Entries 3966 Mean x 22.17 Mean y 77.64 RMS x 341.9 RMS y 341.1 0 0 0 0 3966 0 0 0 0

X vs Y barrel chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north chamber mu_x_vs_y10

Entries 2378 Mean x 5.086 Mean y 2.415 RMS x 216.5 RMS y 212.6 0 0 0 0 2378 0 0 0 0

X vs Y north chamber

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south chamber mu_x_vs_y20

Entries 2351 Mean x 4.476 Mean y 51.93 RMS x 261.3 RMS y 235.2 0 0 0 0 2351 0 0 0 0

X vs Y south chamber

muon digi: X vs Y scint.

p1405_mu_dig_0512 vs p1409_mu_dig_0512

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel scint mu_x_vs_y01

Entries 1203 Mean x 10.92 Mean y 46.84 RMS x 345.4 RMS y 331.4 0 0 0 0 1203 0 0 0 0

X vs Y barrel scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north scint mu_x_vs_y11

Entries 1217 Mean x 27.64 Mean y 22.45 RMS x 255 RMS y 230.6 0 0 0 0 1217 0 0 0 0

X vs Y north scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south scint mu_x_vs_y21

Entries 1273 Mean x -38.09 Mean y 38.61 RMS x 270.9 RMS y 238.2 0 0 0 0 1273 0 0 0 0

X vs Y south scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y barrel scint mu_x_vs_y01

Entries 1218 Mean x 2.422 Mean y 48.52 RMS x 351 RMS y 347.6 0 0 0 0 1218 0 0 0 0

X vs Y barrel scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y north scint mu_x_vs_y11

Entries 1359 Mean x 4.217 Mean y 16.98 RMS x 247.6 RMS y 228.5 0 0 0 0 1359 0 0 0 0

X vs Y north scint

-600 -400 -200 0 200 400 600

-600

-400

-200

0

200

400

600

X vs Y south scint mu_x_vs_y21

Entries 1213 Mean x -8.095 Mean y 42.26 RMS x 278.6 RMS y 238.7 0 0 0 0 1213 0 0 0 0

X vs Y south scint