tconc2 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

-500 -400 -300 -200 -100 0 100 200 300 400 500

ID Entries Mean RMS

8012 124950 7.570 158.6 phi-cotphi corr 0 250 500 750 1000

1250

1500

1750

2000

2250

-0.25 -0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0.25

ID Entries Mean RMS

825 124950 -.7406E-02 .1230 phi-cotphi corr cut 0 200 400 600 800 1000

1200

1400

1600

1800

2000

-0.25 -0.2 -0.15 -0.1 -0.05 0 0.05 0.1 0.15 0.2 0.25

ID Entries Mean RMS

826 67822 -.9987E-02 .1212 cur-cotcur cut 0

200

400

600

800

1000

1200

1400

1600

1800

-0.01 -0.008-0.006-0.004-0.002 0 0.002 0.004 0.006 0.008 0.01

ID Entries Mean RMS

8222 67822 .1769E-04 .5006E-02 cur-cotcur cut cut 0

200

400

600

800

1000

1200

-0.01 -0.008-0.006-0.004-0.002 0 0.002 0.004 0.006 0.008 0.01

ID Entries Mean RMS

8223 12305 -.8721E-04 .3305E-02 dsub cut cot cur 0

100

200

300

400

500

600

700

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8094 7308 .1362E-02 .1748E-01 dsub cut cot cur 0

100

200

300

400

500

600

700

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8094 7308 .1362E-02 .1748E-01 26.86 / 15 Constant 642.1 10.64 Mean .1330E-02 .1426E-03 Sigma .1044E-01 .1384E-03

Eigenvalues

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

1 2 3 4 5 6 7

ID Entries Mean RMS

101 6 6.499 .3349E-01

Chi2 all tracks 0

100

200

300

400

500

600

700

800

0 50 100 150 200 250 300 350 400 450 500

ID Entries Mean RMS

900 124950 137.3 145.7 fvn(i) 0

500

1000

1500

2000

2500

3000

-250 -200 -150 -100 -50 0 50 100 150 200 250

ID Entries Mean RMS

701 124950 16.82 121.6 fvn(i) 0

50

100

150

200

250

300

350

400

-250 -200 -150 -100 -50 0 50 100 150 200 250

ID Entries Mean RMS

702 124950 -12.90 122.1 fvn(i) 0

500

1000

1500

2000

2500

-250 -200 -150 -100 -50 0 50 100 150 200 250

ID Entries Mean RMS

703 124950 -24.50 109.0 res(i) 0

200

400

600

800

1000

1200

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

1001 124950 .2362E-02 .5207E-01 res(i) 0

1000

2000

3000

4000

5000

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

1002 124950 .7904E-02 .2653E-01 res(i) 0

500

1000

1500

2000

2500

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

1003 124950 -.1033E-01 .4825E-01 res(i) 0

200

400

600

800

1000

1200

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

1004 124950 -.7360E-02 .5233E-01 res(i) 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

1005 124950 .2166E-01 .3177E-01 res(i) 0

200

400

600

800

1000

1200

1400

-0.1 -0.08 -0.06 -0.04 -0.02 0 0.02 0.04 0.06 0.08 0.1

ID Entries Mean RMS

1006 124950 -.2316E-02 .4624E-01

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65 1.7 1.75 1.8

ID 806 ENTRIES 124950 .000E+00 510. .174E+05 767. .732E+05 .322E+05 56.0 921. .000E+00

dt vs phi

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65 1.7 1.75 1.8

ID 8072 ENTRIES 6024 .000E+00 1.00 4.00 56.0 .566E+04 297. 2.00 4.00 .000E+00

dt vs phi cut3

-0.5

-0.4

-0.3

-0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65 1.7 1.75 1.8

ID 8071 ENTRIES 118926 .000E+00 509. .174E+05 711. .675E+05 .319E+05 54.0 917. .000E+00

dt vs phi off dsub 0

200

400

600

800

1000

1200

1400

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

808 124950 .8116E-02 .6422E-01 dsub cut cot cur 0

100

200

300

400

500

600

700

800

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8095 6024 .5877E-03 .1794E-01 dsub cut cot cur 0

100

200

300

400

500

600

700

800

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8095 6024 .5877E-03 .1794E-01 32.51 / 10 Constant 736.1 13.68 Mean .9985E-03 .1077E-03 Sigma .7118E-02 .1006E-03 dsub off 0

100

200

300

400

500

600

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8073 118926 .9125E-02 .6801E-01 dsub 0

200

400

600

800

1000

1200

1400

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

808 124950 .8116E-02 .6422E-01 dsub cut cot cur 0

100

200

300

400

500

600

700

800

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8095 6024 .5877E-03 .1794E-01 32.51 / 10 Constant 736.1 13.68 Mean .9985E-03 .1077E-03 Sigma .7118E-02 .1006E-03 dsub off 0

100

200

300

400

500

600

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

8073 118926 .9125E-02 .6801E-01

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65 1.7 1.75 1.8

ID 813 ENTRIES 124950 .000E+00 .860E+04 .316E+05 724. .616E+05 .179E+05 99.0 .442E+04 29.0

dsub vs phi

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

1.3 1.35 1.4 1.45 1.5 1.55 1.6 1.65 1.7 1.75 1.8

ID 8131 ENTRIES 6024 .000E+00 24.0 6.00 56.0 .562E+04 295. 2.00 17.0 .000E+00

dsub vs phi c3

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25

-20 -17.5 -15 -12.5 -10 -7.5 -5 -2.5 0 2.5 5

ID 814 ENTRIES 6024 2.00 27.0 1.00 91.0 .571E+04 176. 1.00 15.0 3.00

dsub vs z0 dsubz 0

200

400

600

800

1000

1200

1400

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

815 124950 .7881E-02 .6427E-01 dsubz cut3 0

100

200

300

400

500

600

700

800

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

816 6024 -.1640E-03 .1773E-01 dsubz cut3 0

100

200

300

400

500

600

700

800

-0.125 -0.1 -0.075 -0.05 -0.025 0 0.025 0.05 0.075 0.1 0.125

ID Entries Mean RMS

816 6024 -.1640E-03 .1773E-01 19.73 / 9 Constant 757.4 14.30 Mean .4242E-04 .1058E-03 Sigma .6876E-02 .1032E-03 dsubz cut3 pt2 0

20

40

60

80

100

120

140

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

ID Entries Mean RMS

817 1266 .2164E-03 .1091E-01 dsubz cut3 pt2 0

20

40

60

80

100

120

140

-0.06 -0.04 -0.02 0 0.02 0.04 0.06

ID Entries Mean RMS

817 1266 .2164E-03 .1091E-01 17.21 / 12 Constant 130.6 5.411 Mean .2499E-04 .1665E-03 Sigma .5007E-02 .1625E-03