ObjectMon #2 TimeMonitor HADTDC Timing

Run:167138 Event: 2953051 # of Events:45299 Time: Wed Aug 6 09:29:30 2003 Ref.Run:165873

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 301715

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 335460 Mean 566.8 RMS 7.247

CHA: Raw Time Check Ok

GOOD

Width [ns]

50 55 60

Events

0 10000

20000

30000

40000

50000

Entries 335460 Mean 55.69 RMS 2.504

CHA: Hit Width Check Ok

GOOD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 281424

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

22000

Entries 366968 Mean 561.4 RMS 6.041

PHA: Raw Time Check Ok

GOOD

Width [ns]

50 55 60 65

Events

0 10000

20000

30000

40000

50000

Entries 366968 Mean 57.28 RMS 2.861

PHA: Hit Width Check Ok

GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA

Entries 100285 Mean 1.666 RMS 0.7721

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

Entries 114772 Mean 564.1 RMS 7.824

WHA: Raw Time Check Ok

GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

RawWidthWHA Entries 114772 Mean 54.3 RMS 2.843

WHA: Hit Width Check Ok

GOOD