aa800, page=1, Wed Apr 14 10:36:37 2004 -- invm Entries 7598 / ndf 2χ 13.9 / 7 Constant 70.6± 2291 Mean 0.00± 0.13 Sigma 0.00168 ± 0.03951

inv mass GeV

0 0.2 0.4 0.6 0.8 1 1.2

-2000 0 2000

4000

6000

8000

10000

12000 ± ± ±

Real-Mixed