file=1000 J.Balewski ,Wed Jul 2 09:38:42 2003

invm

Entries 0 Mean -7.32 RMS 7.852 Underflow 0 Overflow -163 Integral 163 / ndf

2χ 9.832 / 12 Constant 13.69±

237.6 Mean 0.002728 ± 0.1312 Sigma 0.003101 ± 0.04159

0 0.2 0.4 0.6 0.8 1 1.2 1.4

-100 0 100 200 300 400 500 600

± ± ± ±

Difference Real-Mixed 0ener

Entries 2262 Mean 1.962 RMS 1.055 Underflow 0 Overflow -11 Integral 2273

0 2 4 6 8 10 12 14 16 18 20 0

500

1000

1500

2000

0ener

Difference Real-Mixed 0pt

Entries 2262 Mean 0.8386 RMS 0.4821 Underflow 0 Overflow -8 Integral 2270

0 1 2 3 4 5 6 7 8 9 10 0 200 400 600 800 1000

1200 0pt Difference Real-Mixed

0Z Entries 2262 Mean 0.1549 RMS 0.09351 Underflow 0 Overflow 0 Integral 2262

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

200

400

600

800

1000

Difference Real-Mixed 0Ang

Entries 2262 Mean 0.1454 RMS 0.05174 Underflow 0 Overflow 0 Integral 2262

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0 100 200 300 400 500 600 700 Difference Real-Mixed 0eta

Entries 2262 Mean 1.492 RMS 0.2068 Underflow 0 Overflow 0 Integral 2262

0 0.5 1 1.5 2 2.5 0 200 400 600 800 1000

1200

0eta

Difference Real-Mixed