95 238Am

D: 48420 50 S_n: 6200 70 S_p: 3960 50 Q_{EC}: 2260 50 Q_a: 6040 50 Nuclear Bands A Fission isomer Levels:

0, 1^+, 98 2 m, %a=1.0·10^{- 4} 4, %EC+% b^+>99.99 A »2500 , 35 10 ms, %SF £100

238 95Am 0 1+

SF ~2500

IT

98 m

35 us