ObjectMon #97 MuonMonitor Slide Show

Run:205021 Event: 1906838 # of Events:24474 Time: Mon Oct 3 19:32:23 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 30 40 50 60

Entries 2219

= 1.2 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 20 40 60 80

Entries 2219

Mean -2.541

=0.88 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400

Entries 2219 Mean 0.007765 RMS 7.514

=0.94 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 15 20 25 30 35 40

Entries 1405

= 1.1 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 100 200 300 400 500 600

Entries 3173 Mean 0.0072

= 1.2 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200

Entries 1405 Mean 0.3824 RMS 10.09

= 1.1 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 25 30 Entries 717

=0.87 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 10 20 30 40 50 60

Entries 717 Mean 33.61

= 1.4 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150

Entries 717 Mean -0.2703 RMS 12.53

=0.89 (< 3) 2χ xΔ CMX

ObjectMon #98 MuonMonitor Slide Show 1

Run:205021 Event: 1906838 # of Events:24474 Time: Mon Oct 3 19:32:23 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 2 4 6 8 10 Entries 152

= 4.7 (> 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 5 10 15

Entries 152

Mean 16

= 3.3 (> 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 5 10 15

Entries 152 Mean -1.457 RMS 25.48

= 1 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1

10

210 310

Entries 3173 Mean 2.779 RMS 1.538

= 5.9 (> 3) 2χ Muon Type

ObjectMon #94 MuonMonitor Muons by System

Run:205021 Event: 1906838 # of Events:24474 Time: Mon Oct 3 19:32:23 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 20 25 30 35 40 45 50

Entries 2219 Mean 181 RMS 103

= 1.1 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

50

100

150

Entries 2219 Mean -0.006728 RMS 0.3461

=0.74 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400

Entries 2219 Mean 0.007765 RMS 7.514

=0.94 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 15 20 25 30 35 40

Entries 1405 Mean 182.9 RMS 104.3

= 1.4 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100

Entries 1405 Mean -0.002094 RMS 0.3044

= 1 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200

Entries 1405 Mean 0.3824 RMS 10.09

= 1.1 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 25

Entries 717 Mean 166.3 RMS 106.3

=0.99 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60

Entries 717 Mean 0.06306 RMS 0.8492

=0.93 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150

Entries 717 Mean -0.2703 RMS 12.53

=0.89 (< 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Muons Generic

Run:205021 Event: 1906838 # of Events:24474 Time: Mon Oct 3 19:32:23 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 210 310

Entries 3173 Mean 2.779 RMS 1.538

= 5.9 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310 410

Entries 24176 Mean 0.1312 RMS 0.4659

= 3.9 (> 3) 2χ Number of Muons