ObjectMon #92 MuonMonitor Slide Show

Run:179236 Event: 604010 # of Events:5796 Time: Thu Feb 19 16:31:24 2004 Ref.Run:177622

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

50

100

150 Entries 5187

= 1.5 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 50 100 150

Entries 5187

Mean -1.635

= 1.3 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600

Entries 5187 Mean 0.178 RMS 9.096

= 1.4 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80 100 Entries 2183

=0.93 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 200

400 600

Entries 6181 Mean 0.0019

= 2.3 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200

Entries 2183 Mean 0.02471 RMS 12.31

= 1.2 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30

Entries 661

=0.74 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400 -200 0 200 400 0 10 20 30 40 50

Entries 661 Mean 8.8

=0.73 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

50

100

150

Entries 661 Mean 0.03469 RMS 10.92

= 1.3 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:179236 Event: 604010 # of Events:5796 Time: Thu Feb 19 16:31:24 2004 Ref.Run:177622

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 2 4 6 8 10 12 Entries 201

= 1.7 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 5 10 15

Entries 201

Mean 3.959

= 1.5 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 5 10 15

Entries 201 Mean 0.3294 RMS 24.09

=0.97 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

Entries 6181 Mean 2.173 RMS 1.48

= 5.3 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:179236 Event: 604010 # of Events:5796 Time: Thu Feb 19 16:31:24 2004 Ref.Run:177622

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80 100 120

Entries 5187 Mean 175.5 RMS 103.6

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200 250 300

Entries 5187 Mean 0.002333 RMS 0.3575

= 1.6 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 200 400 600

Entries 5187 Mean 0.178 RMS 9.096

= 1.4 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60

Entries 2183 Mean 173.1 RMS 101.4

= 1.1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

50

100

150

Entries 2183 Mean 0.0003309 RMS 0.3136

= 1.3 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200

Entries 2183 Mean 0.02471 RMS 12.31

= 1.2 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 5 10 15 20 25

Entries 661 Mean 160.5 RMS 103.1

=0.91 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 10 20 30 40 50

Entries 661 Mean 0.01576 RMS 0.8578

=0.89 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0

50

100

150

Entries 661 Mean 0.03469 RMS 10.92

= 1.3 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:179236 Event: 604010 # of Events:5796 Time: Thu Feb 19 16:31:24 2004 Ref.Run:177622

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 1 10 10^2

10^3

Entries 6181 Mean 2.173 RMS 1.48

= 5.3 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 10^2

10^3

Entries 5796 Mean 1.066 RMS 1.016

= 5.5 (> 3) 2χ Number of Muons