ObjectMon #92 MuonMonitor Slide Show

Run:177214 Event: 6969685 # of Events:150134 Time: Thu Jan 1 08:18:08 2004 Ref.Run:176632

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800 1000

Entries 46592

= 1.3 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0

500

1000

1500

Entries 46592

Mean -2.847

= 1.2 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

6000

Entries 46592 Mean 0.03604 RMS 8.975

= 1.1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

200

400

600

Entries 19392

= 1.4 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 500 1000

1500

2000

2500

Entries 53292 Mean 0.0097

= 2.3 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

Entries 19392 Mean 0.01573 RMS 13.17

= 1.4 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

50

100

150

Entries 3072

= 1.3 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400 -200 0 200 400 0 50 100 150 200 250

Entries 3072 Mean -33.52

= 6.3 (> 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200 250 300

Entries 3072 Mean -0.1684 RMS 19.61

= 1.2 (< 3) 2χ xΔ CMX

ObjectMon #93 MuonMonitor Slide Show 1

Run:177214 Event: 6969685 # of Events:150134 Time: Thu Jan 1 08:18:08 2004 Ref.Run:176632

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80

Entries 2137

= 1.2 (< 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0

100

200

300

Entries 2137

Mean -31.32

=0.75 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 20 40 60 80 100 120

Entries 2137 Mean -0.2028 RMS 28.03

=0.99 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

10^3

10^4

Entries 53292 Mean 2.139 RMS 1.581

= 8.9 (> 3) 2χ Muon Type

ObjectMon #89 MuonMonitor Muons by System

Run:177214 Event: 6969685 # of Events:150134 Time: Thu Jan 1 08:18:08 2004 Ref.Run:176632

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 200 400 600 800

Entries 46592 Mean 177.9 RMS 103.4

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 500 1000

1500

2000

2500

3000

Entries 46592 Mean -0.002966 RMS 0.3598

= 1.3 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 1000

2000

3000

4000

5000

6000

Entries 46592 Mean 0.03604 RMS 8.975

= 1.1 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 100 200 300 400 500

Entries 19392 Mean 177.3 RMS 103.4

= 1.5 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

500

1000

Entries 19392 Mean 0.0007513 RMS 0.3104

= 1.2 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 500 1000

1500

Entries 19392 Mean 0.01573 RMS 13.17

= 1.4 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 20 40 60 80 100

Entries 3072 Mean 171.7 RMS 104.6

=0.82 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200 250

Entries 3072 Mean -0.06857 RMS 0.8356

=0.79 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200 250 300

Entries 3072 Mean -0.1684 RMS 19.61

= 1.2 (< 3) 2χ xΔ CMX

ObjectMon #91 MuonMonitor Muons Generic

Run:177214 Event: 6969685 # of Events:150134 Time: Thu Jan 1 08:18:08 2004 Ref.Run:176632

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10

10^3

10^4

Entries 53292 Mean 2.139 RMS 1.581

= 8.9 (> 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 10^2

10^3

10^4

10^5

Entries 150134 Mean 0.3549 RMS 0.7147

=3e+02 (> 3) 2χ Number of Muons