I-270

Scioto

Scioto Big Run

River

Big

W a l n u t

Cr e e k

U.S. Route 23

I-270

Scioto

River

Big

W a l n u t

Cr e e k

U.S. Route 23

Scioto Big Run

# Page Number and Runner

Figure 3. Measured potentiometric surface of glacial-drift aquifer for (A) October 1979, (B) March 1986, and (C) August 1988. (From Cunningham and Others, 1995).

83^o02’30"

39^o52’30"

83^o A 82^o57’30"

39^o50’

6

7

0

6

6

0

6

8

0

7

1

0

7

0

0

7

1

0

68

0

7

1

0

7

00

6

90

6

9

0

I-270

Scioto

Scioto Big Run

River

Big

W a l n u t

Cr e e k

U.S. Route 23

Fr-116

Fr-117

Fr-64

Fr-106

TH72

Fr-70

Fr-62

Fr-65

Fr-130

Fr-36

Fr-3

Fr-38

Fr-123

Fr-37

Fr-125

TH83 115 Fr-118

Fr-131 Fr-120 101 Fr-119

Fr-121

Fr-73

Fr-72

Fr-52

Fr-46

TH67 103 TH11

TH48

104

83^o02’30" 83^o B 82^o57’30"

Fr-202

Fr-120 101 TH48 103 104 TH11

TH72 Fr-126

Fr-151

115 Fr-36 Fr-117

Fr-116

Fr-121

Fr-119

Fr-73 Fr-123 Fr-3

Fr-131

Fr-109

Fr-254

6

7

0

6

8

0

71

0

7

00

69

0

6

8

0

7

1

0

700

7

1

0

Fr-244 Fr-246

6

5

0

6

60

7

1

0

6

9

0

68

0

67

0

6

8

0

6

9

0

7

0

0

6

6

0

7

0

0

6

7

0

39^o52’30"

Fr-202

Fr-104

Fr-121 101 103 115 104 TH11 TH18 TH72

Fr-117

Fr-116

Fr-18

Fr-126

Fr-151

TH67

TH46 Fr-147

Fr-123

Fr-131

39^o50’

Base from U.S. Geological Survey Commercial Point 1966, photorevised 1988; Lockborne 1964, photorevised 1985; Southeast Columbus 1964, photorevised 1985; Southwest Columbus 1965, photoinspected 1984. Polyconic projection

C

COLLECTOR WELL AND IDENTIFIER

EXPLANATION

DOMESTIC OR MONITOR WELL AND IDENTIFIER

QUARRY SUMP

104 Fr-46

680 MEASURED WATER-LEVEL CONTOUR--

Hachures indicate depression. Dashed where approimately located. Contour interval 10 feet

0

0

1 2 MILES

1 2 KILOMETERS

Study Area

OHIO