Summary

Diffractive structure function, F^D_{jj} is evaluated based on the ratio of SD to ND rates, R SD_{ND} (x_{p̄}) • F^D_{jj} (β, ξ) ≈ C 1 β 1 ξ for 10^{−3}/ξ < β < 0.5 and 0.035 < ξ < 0.095

• Comparison with H1 results Discrepancy found both in normalization and shape of the β distribution

⇒ Breakdown of Factorization