hist_ratio_HF29_remap_cut_minus

Entries 2116 Mean 0.8704 RMS 0.5652

0 0.5 1 1.5 2 2.5 3 0 10 20 30 40 50 60 70 80 Ratio of RecHit to TPG (HF:29)