htemp Entries 2114 Mean 35.71 RMS 0.2643

34 34.5 35 35.5 36 36.5 37 37.5 38 0 20 40 60 80 100 120 140 160 180 200 220 240 tof {tof>34 && tof<38 && pr>4 && pr<6 && beamid==2}

= 165 ps πσ = 178 ps pσ