FPP preLockup Checklist

Who: When:

Item Chamber 1 Chamber 2 Chamber 3 Chamber 4 dowel pins in (U/L)? LV power on? threshold (V) HV (kV) HV/LV/th control \upstairs?"

gas in (ball level) gas out (digital) pulser tested? cosmic tested?