Acknowledgements

Many individuals and groups helped to prepare the PHENIX Conceptual Design Report. From the BNL Graphic Arts Department, Ms. Patricia Yalden designed the cover and divider graphics, and Ms. Kathy Foy designed the PHENIX logo, based on an idea from Hubert van Hecke. The logo on the back cover was supplied by the PHENIX-J Group. Also from the BNL Graphic Arts Department, Ms. Kelly Mazzola and Mr. Kevin Collins deserve special recognition and thanks for their early morning assistance and cooperation in helping to get the first copies of the CDR and WBS printed in time to make the TAC deadline. Dr. Tom Throwe of the RHIC Detector Group provided a good computing environment on the RHIC UNIX cluster for preparing this document. With patience and good humor, he lead many of us through our first experiences with UNIX and Emacs. We all survived. Mr. Richie Ruggiero of the BNL Physics Design Group produced many last minute drawings. During the preparation of the CDR, Ms. Donna Earley kept the group and the process moving along. Lastly, the editor (WLK) would like to thank his editor (NJM).