had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 Entries 107487

CHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

Entries 118358 Mean 566.9 RMS 7.006

CHA: Raw Time

/ndf=8.4e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

Entries 118358 Mean 55.65 RMS 2.551

CHA: Hit Width /ndf= 54 (>15) 2χ BAD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1

Entries 101962

PHA: Eff. Eff. Check Failed BAD

raw time [ns]

550 560 570 580

Events

0 1000

2000

3000

4000

5000

6000

7000

8000

Entries 133172 Mean 561.3 RMS 6.016

PHA: Raw Time

/ndf=3.9e+02 (>15) 2χ BAD

Width [ns]

50 55 60 65

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

Entries 133172 Mean 57.21 RMS 2.826

PHA: Hit Width /ndf= 14 (<15) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1

HADTDCEffWHA Entries 35605 Mean 1.669 RMS 0.7715

WHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

1800

2000

Entries 40632 Mean 564.2 RMS 7.567

WHA: Raw Time

/ndf=2.2e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

RawWidthWHA Entries 40632 Mean 54.3 RMS 2.836

WHA: Hit Width /ndf= 47 (>15) 2χ BAD

ObjectMon #2 TimeMonitor HADTDC Timing

Run:168820 Event: 685776 # of Events:16440 Time: Thu Sep 4 23:37:05 2003 Ref.Run:165793