-0.03 -0.02 -0.01 0 0.01 0.02 0.03 0

50

100

150

200

250 g1 Nent = 1991 Mean = -0.0003781 RMS = 0.003467 sta-1 stub residuals (cm) - pla-0

-0.15 -0.1 -0.05 0 0.05 0.1 0.15 0

50

100

150

200

250 g1 Nent = 1995 Mean = -0.0005392 RMS = 0.02067 sta-1 stub residuals (cm) - pla-1

-0.03 -0.02 -0.01 0 0.01 0.02 0.03 0 20 40 60 80 100 120 140 160 g1 Nent = 2016 Mean = 0.0004424 RMS = 0.006015 sta-1 stub residuals (cm) - pla-2

-0.15 -0.1 -0.05 0 0.05 0.1 0.15 0 20 40 60 80 100 120 140 160 180 200 220 g1 Nent = 2004 Mean = 0.001189 RMS = 0.02249 sta-1 stub residuals (cm) - pla-3 g1

-0.03 -0.02 -0.01 0 0.01 0.02 0.03 0 20 40 60 80 100 120 140 160 180 200 220 g1 Nent = 2014 Mean = -0.0003759 RMS = 0.004 sta-1 stub residuals (cm) - pla-4

-0.15 -0.1 -0.05 0 0.05 0.1 0.15 0 20 40 60 80 100 120 140 160 180 200 220 240 g1 Nent = 2032 Mean = -0.0001479 RMS = 0.02311 sta-1 stub residuals (cm) - pla-5