0 500 1000

2000

3000

4000

5000

6000

8000

100

A=3

NP A474, 1(1987)

Evaluators: D.R. Tilley, H.R. Weller, and H. Hasan 3 1H Q_{β−}18.591

1/2+ 12.33 y β−

6257.25 Sn

3 2He 1/2+

5493.49 Sp