Parkfield Seismicity 1982-1994 and Possible Alert Boxes

Parkfield Box

Depth ≥ 0 km

Middle Mt. Box

Depth ≥ 6.5 km

Small Middle Mt. Box

Depth ≥ 7.5km

1966 Mainshock and Foreshock