ObjectMon #2 TimeMonitor HADTDC Timing

Run:191303 Event: 965077 # of Events:18079 Time: Fri Dec 17 20:31:25 2004 Ref.Run:185777

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 96427

CHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580 590

Events

0 1000

2000

3000

4000

5000

Entries 100247 Mean 568.9 RMS 7.28

CHA: Raw Time

/ndf=5.3e+02 (>17) 2χ BAD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

Entries 100247 Mean 55.41 RMS 2.621

CHA: Hit Width

/ndf=1.3e+02 (>17) 2χ BAD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 121349

PHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

Entries 157227 Mean 561.7 RMS 6.032

PHA: Raw Time

/ndf=3.5e+02 (>18) 2χ BAD

Width [ns]

50 55 60 65

Events

0 5000

Entries 157227 Mean 57.09 RMS 2.833

PHA: Hit Width

/ndf= 5.1 (<18) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 32661 Mean 1.838 RMS 0.6829

WHA: Eff. Eff. Check Ok GOOD

raw time [ns]

550 560 570 580

Events

0 200 400 600 800 1000

1200

1400

1600

Entries 34996 Mean 565.9 RMS 7.869

WHA: Raw Time

/ndf=1.1e+02 (>15) 2χ BAD

Width [ns]

50 55 60

Events

0 1000

2000

3000

4000

5000

RawWidthWHA Entries 34996 Mean 54.36 RMS 2.645

WHA: Hit Width /ndf= 19 (>15) 2χ BAD