ObjectMon #2 TimeMonitor HADTDC Timing

Run:183083 Event: 3009996 # of Events:32034 Time: Mon May 24 07:30:54 2004 Ref.Run:182337

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 Entries 265102

CHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570 580

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 293131 Mean 565.3 RMS 7.13

CHA: Raw Time /ndf= 26 (>21) 2χ BAD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Entries 293131 Mean 55.36 RMS 2.526

CHA: Hit Width

/ndf= 66 (>21) 2χ BAD

had. cell energy [Gev]

0 2 4 6 8 10

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Entries 206345

PHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

550 560 570

Events

0 2000

4000

6000

8000

10000

12000

14000

16000

Entries 261721 Mean 560.4 RMS 6.128

PHA: Raw Time /ndf= 25 (>20) 2χ BAD

Width [ns]

50 55 60

Events

0 5000

10000

15000

20000

25000

30000

35000

40000

Entries 261721 Mean 56.93 RMS 2.662

PHA: Hit Width

/ndf= 4.9 (<20) 2χ GOOD

had. cell energy [GeV]

0 0.5 1 1.5 2 2.5 3

Efficiency

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

HADTDCEffWHA Entries 87028 Mean 1.685 RMS 0.7638

WHA: Eff. Eff. Check Ok

GOOD

raw time [ns]

540 550 560 570 580

Events

0 500 1000

1500

2000

2500

3000

3500

4000

4500

Entries 100239 Mean 563.2 RMS 8.124

WHA: Raw Time /ndf= 5.2 (<17) 2χ GOOD

Width [ns]

50 55 60

Events

0 2000

4000

6000

8000

10000

12000

RawWidthWHA Entries 100239 Mean 54.12 RMS 2.867

WHA: Hit Width /ndf= 44 (>17) 2χ BAD