ObjectMon #97 MuonMonitor Slide Show

Run:205317 Event: 2578442 # of Events:34947 Time: Sat Oct 8 20:57:42 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 40 50 60 70 80 90

Entries 3092

= 1.1 (< 3) 2χ (Stub) ϕ CMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-200-100 0 100 200 0 20 40 60 80 100

Entries 3092

Mean 0.2868

= 1.2 (< 3) 2χ CMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500 600

Entries 3092 Mean -0.08905 RMS 7.594

= 1.6 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 30 40 50 60 70

Entries 1926

=0.94 (< 3) 2χ (Stub) ϕ CMP ^{Entries 0}_{Mean 0}

RMS 0

T charge/p

-1 -0.5 0 0.5 1 0 200 400 600 800

Entries 4528 Mean 0.0048

= 1.3 (< 3) 2χ T Charge/p^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200 250 300

Entries 1926 Mean 0.06587 RMS 10.21

= 1.4 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0 10 20 30 40 Entries 1050

= 1.4 (< 3) 2χ (Stub) ϕ CMX ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-400-200 0 200 400 0 20 40 60 80 100

Entries 1050 Mean 34.97

=0.72 (< 3) 2χ CMX Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200 250

Entries 1050 Mean -0.1879 RMS 12.18

=0.73 (< 3) 2χ xΔ CMX

ObjectMon #98 MuonMonitor Slide Show 1

Run:205317 Event: 2578442 # of Events:34947 Time: Sat Oct 8 20:57:42 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 0

5

10

15 Entries 265

= 5.5 (> 3) 2χ (Stub) ϕ BMU ^{Entries 0}_{Mean 0}

RMS 0

z [cm]

-500 0 500 0 10 20 30

Entries 265

Mean -56.89

= 2.8 (< 3) 2χ BMU Z (Stub) ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 5 10 15 20

Entries 265 Mean -2.606 RMS 29.22

=0.92 (< 3) 2χ xΔ BMU

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 -1 -0.5 0 0.5 1 Not Checked

Number of Muons Bmu Entries 0 Mean 0 RMS 0

T charge/p

-1 -0.5 0 0.5 1 -1 -0.5 0 0.5 1

Entries 0

Mean 0.0000

Not Checked Bmu T Charge/p

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10

210

310

Entries 4528 Mean 2.861 RMS 1.647

= 2 (< 3) 2χ Muon Type

ObjectMon #94 MuonMonitor Muons by System

Run:205317 Event: 2578442 # of Events:34947 Time: Sat Oct 8 20:57:42 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 30 40 50 60 70

Entries 3092 Mean 179.6 RMS 104.9

= 1.2 (< 3) 2χ ϕ Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 50 100 150 200

Entries 3092 Mean -0.002889 RMS 0.3495

=0.94 (< 3) 2χ η Muon CMU ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 100 200 300 400 500 600

Entries 3092 Mean -0.08905 RMS 7.594

= 1.6 (< 3) 2χ xΔ CMU

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 10 20 30 40 50 60

Entries 1926 Mean 177.7 RMS 105.2

= 1.1 (< 3) 2χ ϕ Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0

50

100

150

Entries 1926 Mean -0.008283 RMS 0.3122

=0.81 (< 3) 2χ η Muon CMP ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -40 -20 0 20 40 0 50 100 150 200 250 300

Entries 1926 Mean 0.06587 RMS 10.21

= 1.4 (< 3) 2χ xΔ CMP

Entries 0 Mean 0 RMS 0

ϕ 0 100 200 300 5 10 15 20 25 30 35

Entries 1050 Mean 167.6 RMS 106.6

= 1.4 (< 3) 2χ ϕ Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

η -2 -1 0 1 2 0 20 40 60 80 100

Entries 1050 Mean 0.05564 RMS 0.8482

= 1 (< 3) 2χ η Muon CMX ^{Entries 0}_{Mean 0}

RMS 0

x [cm] Δ -60 -40 -20 0 20 40 60 0 50 100 150 200 250

Entries 1050 Mean -0.1879 RMS 12.18

=0.73 (< 3) 2χ xΔ CMX

ObjectMon #96 MuonMonitor Muons Generic

Run:205317 Event: 2578442 # of Events:34947 Time: Sat Oct 8 20:57:42 2005 Ref.Run:204204

Entries 0 Mean 0 RMS 0

type

0 2 4 6 8 10 10

210

310

Entries 4528 Mean 2.861 RMS 1.647

= 2 (< 3) 2χ Muon Type

Entries 0 Mean 0 RMS 0

N 0 2 4 6 8 10 1 10 210 310 410

Entries 34491 Mean 0.1313 RMS 0.47

= 2.7 (< 3) 2χ Number of Muons