-0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0 20 40 60 80 100 120 140 160 180 Nent = 2014 3.868 ± Constant = 105.2 0.0006284 ± Mean = 0.002301 0.0007196 ± Sigma = 0.02597 sta-0 stub resolution in phi direction (cm) ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 20 40 60 80 100 120 Nent = 2013 2.931 ± Constant = 104.6 0.00726 ± Mean = 0.02105 0.004362 ± Sigma = 0.2738

sta-0 stub resolution in theta direction (cm) ± ± ±

-0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0 20 40 60 80 100 120 140 160 180 200 Nent = 2056 4.802 ± Constant = 122.7 0.0005541 ± Mean = 0.0003988 0.0007155 ± Sigma = 0.023 sta-1 stub resolution in phi direction (cm) ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 20

40 60

80 100

120 Nent = 2032 3.12 ± Constant = 114.7 0.006044 ± Mean = 0.009286 0.003561 ± Sigma = 0.2526 sta-1 stub resolution in theta direction (cm) Nent = 2032 ± ± ±

-0.2 -0.15 -0.1 -0.05 -0 0.05 0.1 0.15 0.2 0 20 40 60 80 100 120 140 160 180 200 Nent = 1935 3.91 ± Constant = 109.3 0.0006152 ± Mean = 0.0005498 0.0006881 ± Sigma = 0.02566 sta-2 stub resolution in phi direction (cm) ± ± ±

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0 20 40 60 80 100 120 Nent = 1922 3.455 ± Constant = 125.8 0.005523 ± Mean = 0.002437 0.003379 ± Sigma = 0.2299 sta-2 stub resolution in theta direction (cm) ± ± ±