0 100 200 300 400 500 600 700 0 20 40 60 80 100 120 140 160 180 200 220 240 htemp Nent = 1921 Mean = 451.9 RMS = 118.1 timing.adcmax {timing.eta==12&timing.phi==6&run==2232} htemp