h400 Entries 14525 Mean 3.069 RMS 0.1875 / ndf

2χ 41.54 / 13 Prob 7.792e-05 Background 56.4±

484.5 Constant 31.77±

1873 Mean 0.001301 ± 3.09 Sigma 0.001337 ± 0.08263 Slope 18.56±

-36.35

2 2.2 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

± ±

Di-muon mass Pt>1.5 2.6<M<3.5