π0 → e+e−e+e− from fully reconstructed K_L → π^0π^0π^0

P Test

Fit to: 1N dNdϕ = 1 + αcos2ϕ For events with M(e+e−) > 10MeV :

Fit to data yields: α = −0.239 ± 0.030 Expectation: α = −0.250 ± 0.003

Previous Measurement:

Samios et. al., Phys. Rev. 126, 1844 (1962) α = −0.12 ± 0.15 (112 Events, Both opening angles > 3^∘) KTeV measurement is 10 times better!