YMon #87 Slides ShowerMax Slide

Run:150853 Event: 432075 # of Events:1820 Time: Mon Sep 2 01:07:50 2002

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0

0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

1820 events

CES Wedge Wire Occupancy

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0

0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

1820 events

CES Wedge Strip Occupancy

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0

0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

1820 events

CPR Wedge Wire Occupancy

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0

0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

1820 events

CCR Wedge Pad Occupancy

Phi Octants (0-7:U ; 8-15:V)

0 2 4 6 8 10 12 14 0

0.02

0.04

0.06

0.08

0.1

0.12

1820 events

PES Octant West Occupancy

Phi Octants (0-7:U ; 8-15:V)

0 2 4 6 8 10 12 14 0

0.02

0.04

0.06

0.08

0.1

0.12

1820 events

PES Octant East Occupancy

Phi Wedges (0-23:West ; 24-47:East)

0 5 10 15 20 25 30 35 40 45 0

0.02

0.04

0.06

0.08

0.1

0.12

0.14

0.16

1820 events

PPR Wedge Occupancy